(kicad_pcb (version 20211014) (generator pcbnew)
  (general
    (thickness 1.6)
  )
  (paper "A4")
  (layers
    (0 "F.Cu" signal)
    (31 "B.Cu" signal)
    (32 "B.Adhes" user "B.Adhesive")
    (33 "F.Adhes" user "F.Adhesive")
    (34 "B.Paste" user)
    (35 "F.Paste" user)
    (36 "B.SilkS" user "B.Silkscreen")
    (37 "F.SilkS" user "F.Silkscreen")
    (38 "B.Mask" user)
    (39 "F.Mask" user)
    (40 "Dwgs.User" user "User.Drawings")
    (41 "Cmts.User" user "User.Comments")
    (42 "Eco1.User" user "User.Eco1")
    (43 "Eco2.User" user "User.Eco2")
    (44 "Edge.Cuts" user)
    (45 "Margin" user)
    (46 "B.CrtYd" user "B.Courtyard")
    (47 "F.CrtYd" user "F.Courtyard")
    (48 "B.Fab" user)
    (49 "F.Fab" user)
  )
  (setup
    (pad_to_mask_clearance 0)
    (pcbplotparams
      (layerselection 0x00010fc_ffffffff)
      (disableapertmacros false)
      (usegerberextensions false)
      (usegerberattributes true)
      (usegerberadvancedattributes true)
      (creategerberjobfile true)
      (svguseinch false)
      (svgprecision 6)
      (excludeedgelayer true)
      (plotframeref false)
      (viasonmask false)
      (mode 1)
      (useauxorigin false)
      (hpglpennumber 1)
      (hpglpenspeed 20)
      (hpglpendiameter 15.000000)
      (dxfpolygonmode true)
      (dxfimperialunits true)
      (dxfusepcbnewfont true)
      (psnegative false)
      (psa4output false)
      (plotreference true)
      (plotvalue true)
      (plotinvisibletext false)
      (sketchpadsonfab false)
      (subtractmaskfromsilk false)
      (outputformat 1)
      (mirror false)
      (drillshape 0)
      (scaleselection 1)
      (outputdirectory "")
    )
  )
  (net 0 "")
  (net 1 "GNDREF")
  (net 2 "BiasT")
  (net 3 "Net-(C2-Pad1)")
  (net 4 "Net-(C2-Pad2)")
  (net 5 "Net-(C4-Pad2)")
  (net 6 "Net-(C4-Pad1)")
  (net 7 "Net-(C5-Pad2)")
  (net 8 "Net-(C6-Pad1)")
  (net 9 "Net-(C6-Pad2)")
  (net 10 "Net-(C8-Pad1)")
  (net 11 "Net-(C8-Pad2)")
  (net 12 "Net-(C9-Pad1)")
  (net 13 "Net-(C9-Pad2)")
  (net 14 "Net-(C10-Pad2)")
  (net 15 "Net-(C10-Pad1)")
  (net 16 "Net-(C11-Pad2)")
  (net 17 "Net-(C12-Pad2)")
  (net 18 "Net-(C13-Pad1)")
  (net 19 "Net-(C13-Pad2)")
  (net 20 "Net-(C14-Pad1)")
  (net 21 "Net-(C14-Pad2)")
  (net 22 "Net-(C15-Pad2)")
  (net 23 "Net-(C15-Pad1)")
  (net 24 "Net-(C16-Pad2)")
  (net 25 "Net-(C17-Pad2)")
  (net 26 "Net-(C20-Pad2)")
  (net 27 "Net-(C20-Pad1)")
  (net 28 "Net-(C21-Pad2)")
  (net 29 "Net-(C21-Pad1)")
  (net 30 "Net-(C22-Pad2)")
  (net 31 "Net-(C23-Pad2)")
  (net 32 "Net-(C31-Pad1)")
  (net 33 "Net-(C32-Pad1)")
  (net 34 "+5V")
  (net 35 "Net-(C40-Pad1)")
  (net 36 "-5V")
  (net 37 "Net-(C53-Pad2)")
  (net 38 "Net-(C54-Pad2)")
  (net 39 "Net-(C55-Pad2)")
  (net 40 "+3.3VA")
  (net 41 "Net-(C58-Pad2)")
  (net 42 "Net-(C59-Pad2)")
  (net 43 "Net-(C63-Pad2)")
  (net 44 "Net-(C64-Pad2)")
  (net 45 "Net-(C67-Pad2)")
  (net 46 "Net-(C68-Pad2)")
  (net 47 "Net-(C71-Pad1)")
  (net 48 "Net-(C71-Pad2)")
  (net 49 "Net-(C72-Pad1)")
  (net 50 "Net-(C73-Pad2)")
  (net 51 "Net-(C74-Pad2)")
  (net 52 "Net-(C83-Pad2)")
  (net 53 "Net-(C83-Pad1)")
  (net 54 "Net-(C84-Pad2)")
  (net 55 "Net-(C84-Pad1)")
  (net 56 "Net-(C89-Pad2)")
  (net 57 "LO1")
  (net 58 "LO2")
  (net 59 "Net-(C90-Pad2)")
  (net 60 "Net-(C92-Pad2)")
  (net 61 "Net-(C93-Pad2)")
  (net 62 "Net-(D31-Pad1)")
  (net 63 "Net-(D34-Pad2)")
  (net 64 "Net-(D35-Pad2)")
  (net 65 "-5Vsense")
  (net 66 "Net-(D36-Pad1)")
  (net 67 "Net-(D51-Pad2)")
  (net 68 "Net-(D52-Pad2)")
  (net 69 "Net-(J2-Pad1)")
  (net 70 "Net-(J2-Pad2)")
  (net 71 "Net-(J2-Pad3)")
  (net 72 "Net-(J2-Pad7)")
  (net 73 "Net-(J2-Pad11)")
  (net 74 "Net-(J2-Pad17)")
  (net 75 "Net-(J3-Pad20)")
  (net 76 "Net-(J3-Pad19)")
  (net 77 "Net-(J3-Pad17)")
  (net 78 "Net-(J3-Pad3)")
  (net 79 "Net-(J4-Pad1)")
  (net 80 "Net-(J4-Pad2)")
  (net 81 "Net-(J4-Pad3)")
  (net 82 "Net-(J4-Pad7)")
  (net 83 "Net-(J4-Pad8)")
  (net 84 "Net-(J4-Pad17)")
  (net 85 "Net-(J4-Pad18)")
  (net 86 "Net-(J4-Pad19)")
  (net 87 "Net-(J4-Pad20)")
  (net 88 "Net-(J51-Pad1)")
  (net 89 "Net-(J52-Pad1)")
  (net 90 "Net-(J52-Pad3)")
  (net 91 "Net-(J52-Pad5)")
  (net 92 "Net-(J52-Pad4)")
  (net 93 "Net-(JP1-Pad2)")
  (net 94 "Net-(JP2-Pad1)")
  (net 95 "+5C")
  (net 96 "Net-(JP3-Pad2)")
  (net 97 "+5VP")
  (net 98 "+6V")
  (net 99 "Net-(Q31-Pad4)")
  (net 100 "Net-(Q33-Pad3)")
  (net 101 "Net-(R54-Pad2)")
  (net 102 "Net-(R55-Pad2)")
  (net 103 "Net-(U2-Pad4)")
  (net 104 "Net-(U51-Pad2)")
  (net 105 "Net-(U51-Pad3)")
  (net 106 "Net-(U53-Pad5)")
  (net 107 "Net-(U53-Pad13)")
  (net 108 "Net-(U53-Pad14)")
  (net 109 "Net-(U53-Pad15)")
  (net 110 "Net-(U53-Pad25)")
  (net 111 "Net-(U54-Pad25)")
  (net 112 "Net-(U54-Pad15)")
  (net 113 "Net-(U54-Pad14)")
  (net 114 "Net-(U54-Pad13)")
  (net 115 "Net-(U54-Pad5)")
  (net 116 "Net-(C56-Pad2)")
  (net 117 "Net-(C60-Pad2)")
  (net 118 "Net-(J32-Pad1)")
  (net 119 "Net-(JP53-Pad2)")
  (net 120 "Net-(JP54-Pad1)")
  (net 121 "Net-(C33-Pad1)")
  (net 122 "Net-(C38-Pad2)")
  (net 123 "Net-(C38-Pad1)")
  (net 124 "Net-(D32-Pad2)")
  (net 125 "Net-(Q32-Pad4)")
  (net 126 "Net-(Q33-Pad1)")
  (net 127 "Net-(R43-Pad2)")
  (net 128 "Net-(R45-Pad2)")
  (net 129 "Net-(R47-Pad2)")
  (net 130 "Net-(R49-Pad2)")
  (net 131 "Net-(U31-Pad1)")
  (net 132 "Net-(U31-Pad6)")
  (net 133 "Net-(U31-Pad7)")
  (net 134 "Net-(L6-Pad2)")
  (net 135 "Net-(D2-Pad3)")
  (net 136 "Net-(JP2-Pad2)")
  (footprint "Inductor_SMD:L_0805_2012Metric_Pad1.05x1.20mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEF0)
    (at 39.8 90.7 180)
    (descr "Inductor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 80, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "inductor handsolder")
    (attr smd)
    (fp_text reference "L50" (at 0.2 1.4) (layer "F.SilkS"))
    (fp_text value "100u" (at 0 1.55) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.15 0 180) (size 1.05 1.2) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2380942857)
      (net 117 "Net-(C60-Pad2)"))
    (pad "2" smd roundrect locked (at 1.15 0 180) (size 1.05 1.2) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2380942857)
      (net 50 "Net-(C73-Pad2)"))
    (model "${KISYS3DMOD}/Inductor_SMD.3dshapes/L_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 46.2 103.5 90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C58" (at -3.9 -1.7 90) (layer "F.SilkS"))
    (fp_text value "100n" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 41 "Net-(C58-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 91 83.7 -90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C59" (at -0.1 -2 90) (layer "F.SilkS"))
    (fp_text value "100n" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 42 "Net-(C59-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 52.5 106.9 90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C63" (at -3.6 0.1 90) (layer "F.SilkS"))
    (fp_text value "100n" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 43 "Net-(C63-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 84.8 79.9625 -90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C64" (at -3.7625 0 90) (layer "F.SilkS"))
    (fp_text value "100n" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 44 "Net-(C64-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 61F1A2FC)
    (at 134.8 123.6 180)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C1" (at 0.02 1.9) (layer "F.SilkS"))
    (fp_text value "res 1n" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.213)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 2 "BiasT"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 130.37566 114.40414)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C2" (at 0.71 -1.92) (layer "F.SilkS"))
    (fp_text value "220p" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 3 "Net-(C2-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 4 "Net-(C2-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 134.774999 126.024999 180)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C3" (at 0.064999 -2.155001) (layer "F.SilkS"))
    (fp_text value "res 220p" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 2 "BiasT"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 118.5 98.9375 -90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C4" (at 0 -1.68 90) (layer "F.SilkS"))
    (fp_text value "220p" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 6 "Net-(C4-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 5 "Net-(C4-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 105.3 92.6 -90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C5" (at 2.86 -1.05 90) (layer "F.SilkS"))
    (fp_text value "22p" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 7 "Net-(C5-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 109.093 89.154 180)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C6" (at 0.02286 1.87198) (layer "F.SilkS"))
    (fp_text value "1n" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 8 "Net-(C6-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 9 "Net-(C6-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 103 92.6 -90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C7" (at -0.06 1.76 90) (layer "F.SilkS"))
    (fp_text value "1nF" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 7 "Net-(C5-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 116.9 85.4625 -90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C8" (at 0 -1.68 90) (layer "F.SilkS"))
    (fp_text value "220p" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 10 "Net-(C8-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 11 "Net-(C8-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 113.1 78.3 -90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C9" (at 0 -1.68 90) (layer "F.SilkS"))
    (fp_text value "10p" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 12 "Net-(C9-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 13 "Net-(C9-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 113 68.7 -90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C10" (at 0 -1.68 90) (layer "F.SilkS"))
    (fp_text value "10p" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 15 "Net-(C10-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 14 "Net-(C10-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 109.1 63.1)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C11" (at 0 -1.68) (layer "F.SilkS"))
    (fp_text value "10p" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 16 "Net-(C11-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 116.41 63.1 180)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C12" (at -3.6 0) (layer "F.SilkS"))
    (fp_text value "10p" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 17 "Net-(C12-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 104.9 61.2)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C13" (at 0 -1.68) (layer "F.SilkS"))
    (fp_text value "10p" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 18 "Net-(C13-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 19 "Net-(C13-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 128.4 81.5 90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C14" (at 3.9 -0.1 90) (layer "F.SilkS"))
    (fp_text value "1n" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0.1 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 20 "Net-(C14-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 21 "Net-(C14-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 94.2 61.2)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C15" (at 0 -1.68) (layer "F.SilkS"))
    (fp_text value "1n" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 23 "Net-(C15-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 22 "Net-(C15-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 96 64.8625 -90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C16" (at -3.6625 -0.5 90) (layer "F.SilkS"))
    (fp_text value "10p" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 24 "Net-(C16-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 123.2 88.6 90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C17" (at 0 -1.68 90) (layer "F.SilkS"))
    (fp_text value "10p" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 25 "Net-(C17-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 96.7625 68 180)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C18" (at -3.1375 -1.5) (layer "F.SilkS"))
    (fp_text value "1nF" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 24 "Net-(C16-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 61F1A3BE)
    (at 125.32106 83.49996 180)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C19" (at 0.2 1.9) (layer "F.SilkS"))
    (fp_text value "1nF" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.213)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 25 "Net-(C17-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 129.5 92.8 180)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C20" (at 0 -1.68) (layer "F.SilkS"))
    (fp_text value "10p" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 27 "Net-(C20-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 26 "Net-(C20-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 115.3 98.9375 -90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C21" (at 0 -1.68 90) (layer "F.SilkS"))
    (fp_text value "220p" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 29 "Net-(C21-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 28 "Net-(C21-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 120.5625 92 180)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C22" (at 1.5525 1.76) (layer "F.SilkS"))
    (fp_text value "220p" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 30 "Net-(C22-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 113.1 91.6)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C23" (at 0 -1.68) (layer "F.SilkS"))
    (fp_text value "220p" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 31 "Net-(C23-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 61F1A2E6)
    (at 112.038 134.804)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C31" (at -3.29 0.03) (layer "F.SilkS"))
    (fp_text value "res" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 32 "Net-(C31-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.213)
      (net 1 "GNDREF") (zone_connect 2))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 70.993 123.063)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C42" (at 0.09398 -1.8288) (layer "F.SilkS"))
    (fp_text value "10u" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 34 "+5V"))
    (pad "2" smd roundrect locked (at 1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 1 "GNDREF"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 67.5 84)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C51" (at 3.6 0) (layer "F.SilkS"))
    (fp_text value "100n" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 40 "+3.3VA"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 61F3136A)
    (at 78.3625 110.7)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C53" (at -0.0625 1.9) (layer "F.SilkS"))
    (fp_text value "1u" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.213)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 37 "Net-(C53-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 61F31346)
    (at 82 105.9 180)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C54" (at 0 1.7) (layer "F.SilkS"))
    (fp_text value "10u" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.213)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 38 "Net-(C54-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 84.1 113.8)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C55" (at 0.1 2) (layer "F.SilkS"))
    (fp_text value "1u" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 39 "Net-(C55-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 93 99.6)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C56" (at -0.1 2.1) (layer "F.SilkS"))
    (fp_text value "10u" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 116 "Net-(C56-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 61F3135C)
    (at 78.4 108.6)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C57" (at 0 -1.68) (layer "F.SilkS"))
    (fp_text value "10u" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.213)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 40 "+3.3VA"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 61F257C3)
    (at 42.8 89.6 -90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C60" (at -3.2 -0.1 90) (layer "F.SilkS"))
    (fp_text value "10u" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.213)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 117 "Net-(C60-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0603_1608Metric_Pad1.08x0.95mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 48.1 103.2625 90)
    (descr "Capacitor SMD 0603 (1608 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C61" (at -3.7375 -1.6 90) (layer "F.SilkS"))
    (fp_text value "10p" (at 0 1.43 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -0.8625 0 90) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 0.8625 0 90) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 41 "Net-(C58-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0603_1608Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0603_1608Metric_Pad1.08x0.95mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 89.1 83.9 -90)
    (descr "Capacitor SMD 0603 (1608 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C62" (at -4 1.4 90) (layer "F.SilkS"))
    (fp_text value "10p" (at 0 1.43 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -0.8625 0 270) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 0.8625 0 270) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 42 "Net-(C59-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0603_1608Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0603_1608Metric_Pad1.08x0.95mm_HandSolder" (layer "F.Cu")
    (tedit 61A0C630)
    (at 52.2 103.2 90)
    (descr "Capacitor SMD 0603 (1608 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C65" (at -4 -1.3 90) (layer "F.SilkS"))
    (fp_text value "10p" (at 0 1.43 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -0.8625 0 90) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 0.8625 0 90) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 43 "Net-(C63-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0603_1608Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0603_1608Metric_Pad1.08x0.95mm_HandSolder" (layer "F.Cu")
    (tedit 61A0C489)
    (at 85.1 83.9 -90)
    (descr "Capacitor SMD 0603 (1608 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C66" (at -2.8 1.9 90) (layer "F.SilkS"))
    (fp_text value "10p" (at 0 1.43 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -0.8625 0 270) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 0.8625 0 270) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 44 "Net-(C64-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0603_1608Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 81.7 84.5 -90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C68" (at 0.3 1.7 90) (layer "F.SilkS"))
    (fp_text value "100n" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 46 "Net-(C68-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0603_1608Metric_Pad1.08x0.95mm_HandSolder" (layer "F.Cu")
    (tedit 61A0C63D)
    (at 53.8 103.2 90)
    (descr "Capacitor SMD 0603 (1608 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C69" (at -3.3 0.6 90) (layer "F.SilkS"))
    (fp_text value "10p" (at 0 1.43 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -0.8625 0 90) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 0.8625 0 90) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 45 "Net-(C67-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0603_1608Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0603_1608Metric_Pad1.08x0.95mm_HandSolder" (layer "F.Cu")
    (tedit 61A0C47F)
    (at 83.5 84.7 -90)
    (descr "Capacitor SMD 0603 (1608 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C70" (at -3.55 1.65 90) (layer "F.SilkS"))
    (fp_text value "10p" (at 0 1.43 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -0.8625 0 270) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 0.8625 0 270) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 46 "Net-(C68-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0603_1608Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 58.3 98.8)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C71" (at 3.6 0) (layer "F.SilkS"))
    (fp_text value "1n" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 47 "Net-(C71-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 48 "Net-(C71-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 79.4 89.3 180)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C72" (at 0.2 1.9) (layer "F.SilkS"))
    (fp_text value "1n" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 49 "Net-(C72-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 48 "Net-(C71-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0603_1608Metric_Pad1.08x0.95mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 44.9 97.1)
    (descr "Capacitor SMD 0603 (1608 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C73" (at 0 -1.43) (layer "F.SilkS"))
    (fp_text value "100p" (at 0 1.43) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -0.8625 0) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 0.8625 0) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 50 "Net-(C73-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0603_1608Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0603_1608Metric_Pad1.08x0.95mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 92.6 90.9 180)
    (descr "Capacitor SMD 0603 (1608 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C74" (at 0.1 1.3) (layer "F.SilkS"))
    (fp_text value "100p" (at 0 1.43) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -0.8625 0 180) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 0.8625 0 180) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 51 "Net-(C74-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0603_1608Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0603_1608Metric_Pad1.08x0.95mm_HandSolder" (layer "F.Cu")
    (tedit 61A0C5D2)
    (at 49.6 93.2 -90)
    (descr "Capacitor SMD 0603 (1608 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C75" (at 0 -1.43 90) (layer "F.SilkS"))
    (fp_text value "100p" (at 0 1.43 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -0.8625 0 270) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 0.8625 0 270) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 50 "Net-(C73-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0603_1608Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0603_1608Metric_Pad1.08x0.95mm_HandSolder" (layer "F.Cu")
    (tedit 61A0C4CD)
    (at 88.3 93.6 90)
    (descr "Capacitor SMD 0603 (1608 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C76" (at -0.0625 -1.6 90) (layer "F.SilkS"))
    (fp_text value "100p" (at 0 1.43 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -0.8625 0 90) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 0.8625 0 90) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 51 "Net-(C74-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0603_1608Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0603_1608Metric_Pad1.08x0.95mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 44.9 100.2)
    (descr "Capacitor SMD 0603 (1608 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C77" (at 0 -1.43) (layer "F.SilkS"))
    (fp_text value "100p" (at 0 1.43) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -0.8625 0) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 0.8625 0) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 50 "Net-(C73-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0603_1608Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0603_1608Metric_Pad1.08x0.95mm_HandSolder" (layer "F.Cu")
    (tedit 61A0C49F)
    (at 92.7 87 180)
    (descr "Capacitor SMD 0603 (1608 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C78" (at 0.5 -1.4) (layer "F.SilkS"))
    (fp_text value "100p" (at 0 1.43) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -0.8625 0 180) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 0.8625 0 180) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 51 "Net-(C74-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0603_1608Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0603_1608Metric_Pad1.08x0.95mm_HandSolder" (layer "F.Cu")
    (tedit 61A0C663)
    (at 54.6 96.4 180)
    (descr "Capacitor SMD 0603 (1608 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C79" (at 0 1.8) (layer "F.SilkS"))
    (fp_text value "100p" (at 0 1.43) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -0.8625 0 180) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 0.8625 0 180) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 117 "Net-(C60-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0603_1608Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0603_1608Metric_Pad1.08x0.95mm_HandSolder" (layer "F.Cu")
    (tedit 61A0C467)
    (at 83 91.6)
    (descr "Capacitor SMD 0603 (1608 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C80" (at 0.1 1.525) (layer "F.SilkS"))
    (fp_text value "100p" (at 0 1.43) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -0.8625 0) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 0.8625 0) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 116 "Net-(C56-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0603_1608Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 45.6 93.3 -90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C83" (at -0.2 1.3 90) (layer "F.SilkS"))
    (fp_text value "47n" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 53 "Net-(C83-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 52 "Net-(C83-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 92.1 93.8 90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C84" (at 0.8 1.6 90) (layer "F.SilkS"))
    (fp_text value "47n" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 55 "Net-(C84-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 54 "Net-(C84-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 61A0C5DC)
    (at 47.8 93.3 -90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C85" (at -3.1 -1.5 90) (layer "F.SilkS"))
    (fp_text value "3n3" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.213)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 52 "Net-(C83-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 61A0C4D7)
    (at 90.1 93.8375 90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C86" (at -3.4625 -1.68 90) (layer "F.SilkS"))
    (fp_text value "3n3" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.213)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 54 "Net-(C84-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 61F257D6)
    (at 42 92.9)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C87" (at -3.3 -0.7) (layer "F.SilkS"))
    (fp_text value "100p" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.213)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 50 "Net-(C73-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 95.3 95.2 180)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C88" (at 0 -1.68) (layer "F.SilkS"))
    (fp_text value "100p" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 51 "Net-(C74-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 41.3 99)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C89" (at -1.9 -1.6) (layer "F.SilkS"))
    (fp_text value "22p" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 57 "LO1"))
    (pad "2" smd roundrect locked (at 1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 56 "Net-(C89-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 95.6 89.1 180)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C90" (at -0.5 1.8) (layer "F.SilkS"))
    (fp_text value "10p" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 58 "LO2"))
    (pad "2" smd roundrect locked (at 1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 59 "Net-(C90-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 48.3 106.9375 90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C92" (at -3.3625 0.1 90) (layer "F.SilkS"))
    (fp_text value "470p" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 60 "Net-(C92-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 89.1 79.9 -90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C93" (at -3.3 0 90) (layer "F.SilkS"))
    (fp_text value "470p" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 61 "Net-(C93-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_TO_SOT_SMD:SOT-23" (layer "F.Cu")
    (tedit 61F1A38C)
    (at 122.66794 107.8225 90)
    (descr "SOT-23, Standard")
    (tags "SOT-23")
    (attr smd)
    (fp_text reference "D1" (at 3.15 0 90) (layer "F.SilkS"))
    (fp_text value "BAV99" (at 0 2.5 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd rect locked (at -1 -0.95 90) (size 0.9 0.8) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 5 "Net-(C4-Pad2)"))
    (pad "2" smd rect locked (at -1 0.95 90) (size 0.9 0.8) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 5 "Net-(C4-Pad2)"))
    (pad "3" smd rect locked (at 1 0 90) (size 0.9 0.8) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 1 "GNDREF") (zone_connect 2))
    (model "${KISYS3DMOD}/Package_TO_SOT_SMD.3dshapes/SOT-23.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "LED_SMD:LED_0805_2012Metric_Pad1.15x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEF1)
    (at 48.7 145.075 -90)
    (descr "LED SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "LED handsolder")
    (attr smd)
    (fp_text reference "D31" (at 0.125 1.9 90) (layer "F.SilkS"))
    (fp_text value "LED" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.025 0 270) (size 1.15 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2173904348)
      (net 62 "Net-(D31-Pad1)"))
    (pad "2" smd roundrect locked (at 1.025 0 270) (size 1.15 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2173904348)
      (net 1 "GNDREF"))
    (model "${KISYS3DMOD}/LED_SMD.3dshapes/LED_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "LED_SMD:LED_0805_2012Metric_Pad1.15x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEF1)
    (at 58.954 145.173 90)
    (descr "LED SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "LED handsolder")
    (attr smd)
    (fp_text reference "D32" (at 0 -1.65 90) (layer "F.SilkS"))
    (fp_text value "LED" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.025 0 90) (size 1.15 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2173904348)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.025 0 90) (size 1.15 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2173904348)
      (net 124 "Net-(D32-Pad2)"))
    (model "${KISYS3DMOD}/LED_SMD.3dshapes/LED_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "LED_SMD:LED_0805_2012Metric_Pad1.15x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEF1)
    (at 54.027 145.121 90)
    (descr "LED SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "LED handsolder")
    (attr smd)
    (fp_text reference "D34" (at 0 -1.65 90) (layer "F.SilkS"))
    (fp_text value "LED" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.025 0 90) (size 1.15 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2173904348)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.025 0 90) (size 1.15 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2173904348)
      (net 63 "Net-(D34-Pad2)"))
    (model "${KISYS3DMOD}/LED_SMD.3dshapes/LED_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "LED_SMD:LED_0805_2012Metric_Pad1.15x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEF1)
    (at 63.8 145.175 90)
    (descr "LED SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "LED handsolder")
    (attr smd)
    (fp_text reference "D35" (at 0 -1.65 90) (layer "F.SilkS"))
    (fp_text value "LED" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.025 0 90) (size 1.15 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2173904348)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.025 0 90) (size 1.15 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2173904348)
      (net 64 "Net-(D35-Pad2)"))
    (model "${KISYS3DMOD}/LED_SMD.3dshapes/LED_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "LED_SMD:LED_0805_2012Metric_Pad1.15x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEF1)
    (at 75.625 91.3)
    (descr "LED SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "LED handsolder")
    (attr smd)
    (fp_text reference "D51" (at 0 -1.65) (layer "F.SilkS"))
    (fp_text value "LED" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.025 0) (size 1.15 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2173904348)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.025 0) (size 1.15 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2173904348)
      (net 67 "Net-(D51-Pad2)"))
    (model "${KISYS3DMOD}/LED_SMD.3dshapes/LED_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "LED_SMD:LED_0805_2012Metric_Pad1.15x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEF1)
    (at 62.175 96.7 180)
    (descr "LED SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "LED handsolder")
    (attr smd)
    (fp_text reference "D52" (at 0.075 1.9) (layer "F.SilkS"))
    (fp_text value "LED" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.025 0 180) (size 1.15 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2173904348)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1.025 0 180) (size 1.15 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2173904348)
      (net 68 "Net-(D52-Pad2)"))
    (model "${KISYS3DMOD}/LED_SMD.3dshapes/LED_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "my_library:SMA_side_PCB" (layer "F.Cu")
    (tedit 61A0A550)
    (at 135.6 117.5)
    (attr through_hole)
    (fp_text reference "J1" (at -3.83242 2.41086) (layer "F.SilkS"))
    (fp_text value "Conn_Coaxial" (at 0.635 -3.81) (layer "F.Fab"))
    (pad "1" smd rect locked (at 0 0) (size 4 1.4) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 4 "Net-(C2-Pad2)"))
    (pad "2" thru_hole rect locked (at 0 -2.286) (size 4 2) (drill 0.762) (layers *.Cu *.Mask)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" thru_hole rect locked (at 0 2.286) (size 4 2) (drill 0.762) (layers *.Cu *.Mask)
      (net 1 "GNDREF") (zone_connect 2))
  )
  (footprint "my_library:KF301-2P" (layer "F.Cu")
    (tedit 5950A6D0)
    (at 100.3 145)
    (attr through_hole)
    (fp_text reference "J31" (at 6.77624 -0.21812) (layer "F.SilkS"))
    (fp_text value "6.5V" (at 0 4) (layer "F.Fab") hide)
    (pad "1" thru_hole oval locked (at -2.5 0) (size 4 4.5) (drill 1.2) (layers *.Cu *.Mask)
      (net 33 "Net-(C32-Pad1)"))
    (pad "2" thru_hole oval locked (at 2.5 0) (size 4 4.5) (drill 1.2) (layers *.Cu *.Mask)
      (net 1 "GNDREF"))
  )
  (footprint "my_library:KF301-2P" (layer "F.Cu")
    (tedit 5950A6D0)
    (at 116.9 145)
    (attr through_hole)
    (fp_text reference "J32" (at -6.88244 2.12122) (layer "F.SilkS"))
    (fp_text value "PTT" (at 0 4) (layer "F.Fab") hide)
    (pad "1" thru_hole oval locked (at -2.5 0) (size 4 4.5) (drill 1.2) (layers *.Cu *.Mask)
      (net 118 "Net-(J32-Pad1)"))
    (pad "2" thru_hole oval locked (at 2.5 0) (size 4 4.5) (drill 1.2) (layers *.Cu *.Mask)
      (net 1 "GNDREF"))
  )
  (footprint "my_library:SMA_side_PCB" (layer "F.Cu")
    (tedit 61A0C16F)
    (at 135.9 134.486)
    (attr through_hole)
    (fp_text reference "J51" (at -3.80984 -0.71436) (layer "F.SilkS"))
    (fp_text value "SMA 10MHz" (at 0.635 -3.81) (layer "F.Fab"))
    (pad "1" smd rect locked (at 0 0) (size 4 1.4) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 88 "Net-(J51-Pad1)"))
    (pad "2" thru_hole rect locked (at 0 2.286) (size 4 2) (drill 0.762) (layers *.Cu *.Mask)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" thru_hole rect locked (at 0 -2.286) (size 4 2) (drill 0.762) (layers *.Cu *.Mask)
      (net 1 "GNDREF") (zone_connect 2))
  )
  (footprint "Jumper:SolderJumper-2_P1.3mm_Open_RoundedPad1.0x1.5mm" (layer "F.Cu")
    (tedit 5B391E66)
    (at 103.55 98.1)
    (descr "SMD Solder Jumper, 1x1.5mm, rounded Pads, 0.3mm gap, open")
    (tags "solder jumper open")
    (attr exclude_from_pos_files exclude_from_bom)
    (fp_text reference "JP1" (at 0.09 2.21) (layer "F.SilkS"))
    (fp_text value "S" (at 0 1.9) (layer "F.Fab"))
    (pad "1" smd custom locked (at -0.65 0) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 34 "+5V") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy 0.5 -0.75)
            (xy 0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
    (pad "2" smd custom locked (at 0.65 0) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 93 "Net-(JP1-Pad2)") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy -0.5 -0.75)
            (xy -0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
  )
  (footprint "Jumper:SolderJumper-2_P1.3mm_Open_RoundedPad1.0x1.5mm" (layer "F.Cu")
    (tedit 5B391E66)
    (at 113.21796 108.00358 90)
    (descr "SMD Solder Jumper, 1x1.5mm, rounded Pads, 0.3mm gap, open")
    (tags "solder jumper open")
    (attr exclude_from_pos_files exclude_from_bom)
    (fp_text reference "JP2" (at -0.0277 2.44094 90) (layer "F.SilkS"))
    (fp_text value "S" (at 0 1.9 90) (layer "F.Fab"))
    (pad "1" smd custom locked (at -0.65 0 90) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 94 "Net-(JP2-Pad1)") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy 0.5 -0.75)
            (xy 0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
    (pad "2" smd custom locked (at 0.65 0 90) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 136 "Net-(JP2-Pad2)") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy -0.5 -0.75)
            (xy -0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
  )
  (footprint "Jumper:SolderJumper-2_P1.3mm_Open_RoundedPad1.0x1.5mm" (layer "F.Cu")
    (tedit 5B391E66)
    (at 93.8 72.4 90)
    (descr "SMD Solder Jumper, 1x1.5mm, rounded Pads, 0.3mm gap, open")
    (tags "solder jumper open")
    (attr exclude_from_pos_files exclude_from_bom)
    (fp_text reference "JP3" (at 0 -1.8 90) (layer "F.SilkS"))
    (fp_text value "S" (at 0 1.9 90) (layer "F.Fab"))
    (pad "1" smd custom locked (at -0.65 0 90) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 95 "+5C") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy 0.5 -0.75)
            (xy 0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
    (pad "2" smd custom locked (at 0.65 0 90) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 96 "Net-(JP3-Pad2)") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy -0.5 -0.75)
            (xy -0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
  )
  (footprint "Jumper:SolderJumper-2_P1.3mm_Open_RoundedPad1.0x1.5mm" (layer "F.Cu")
    (tedit 5B391E66)
    (at 121.2 85.3)
    (descr "SMD Solder Jumper, 1x1.5mm, rounded Pads, 0.3mm gap, open")
    (tags "solder jumper open")
    (attr exclude_from_pos_files exclude_from_bom)
    (fp_text reference "JP4" (at 0 -1.8) (layer "F.SilkS"))
    (fp_text value "S" (at 0 1.9) (layer "F.Fab"))
    (pad "1" smd custom locked (at -0.65 0) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 97 "+5VP") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy 0.5 -0.75)
            (xy 0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
    (pad "2" smd custom locked (at 0.65 0) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 25 "Net-(C17-Pad2)") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy -0.5 -0.75)
            (xy -0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
  )
  (footprint "Jumper:SolderJumper-2_P1.3mm_Open_RoundedPad1.0x1.5mm" (layer "F.Cu")
    (tedit 5B391E66)
    (at 27.7 89.2 180)
    (descr "SMD Solder Jumper, 1x1.5mm, rounded Pads, 0.3mm gap, open")
    (tags "solder jumper open")
    (attr exclude_from_pos_files exclude_from_bom)
    (fp_text reference "JP5" (at -3.2 0.1) (layer "F.SilkS"))
    (fp_text value "S" (at 0 1.9) (layer "F.Fab"))
    (pad "1" smd custom locked (at -0.65 0 180) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 98 "+6V") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy 0.5 -0.75)
            (xy 0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
    (pad "2" smd custom locked (at 0.65 0 180) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 71 "Net-(J2-Pad3)") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy -0.5 -0.75)
            (xy -0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
  )
  (footprint "Jumper:SolderJumper-2_P1.3mm_Open_RoundedPad1.0x1.5mm" (layer "F.Cu")
    (tedit 5B391E66)
    (at 27.7 92.6 180)
    (descr "SMD Solder Jumper, 1x1.5mm, rounded Pads, 0.3mm gap, open")
    (tags "solder jumper open")
    (attr exclude_from_pos_files exclude_from_bom)
    (fp_text reference "JP6" (at -3 0.1) (layer "F.SilkS"))
    (fp_text value "S" (at 0 1.9) (layer "F.Fab"))
    (pad "1" smd custom locked (at -0.65 0 180) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 34 "+5V") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy 0.5 -0.75)
            (xy 0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
    (pad "2" smd custom locked (at 0.65 0 180) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 72 "Net-(J2-Pad7)") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy -0.5 -0.75)
            (xy -0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
  )
  (footprint "Jumper:SolderJumper-2_P1.3mm_Open_RoundedPad1.0x1.5mm" (layer "F.Cu")
    (tedit 5B391E66)
    (at 27.7 95.2 180)
    (descr "SMD Solder Jumper, 1x1.5mm, rounded Pads, 0.3mm gap, open")
    (tags "solder jumper open")
    (attr exclude_from_pos_files exclude_from_bom)
    (fp_text reference "JP7" (at -3.2 0.1) (layer "F.SilkS"))
    (fp_text value "S" (at 0 1.9) (layer "F.Fab"))
    (pad "1" smd custom locked (at -0.65 0 180) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 34 "+5V") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy 0.5 -0.75)
            (xy 0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
    (pad "2" smd custom locked (at 0.65 0 180) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 73 "Net-(J2-Pad11)") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy -0.5 -0.75)
            (xy -0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
  )
  (footprint "Jumper:SolderJumper-2_P1.3mm_Open_RoundedPad1.0x1.5mm" (layer "F.Cu")
    (tedit 5B391E66)
    (at 35.8 63.4 90)
    (descr "SMD Solder Jumper, 1x1.5mm, rounded Pads, 0.3mm gap, open")
    (tags "solder jumper open")
    (attr exclude_from_pos_files exclude_from_bom)
    (fp_text reference "JP8" (at 0 -1.8 90) (layer "F.SilkS"))
    (fp_text value "S" (at 0 1.9 90) (layer "F.Fab"))
    (pad "1" smd custom locked (at -0.65 0 90) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 98 "+6V") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy 0.5 -0.75)
            (xy 0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
    (pad "2" smd custom locked (at 0.65 0 90) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 77 "Net-(J3-Pad17)") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy -0.5 -0.75)
            (xy -0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
  )
  (footprint "Jumper:SolderJumper-2_P1.3mm_Open_RoundedPad1.0x1.5mm" (layer "F.Cu")
    (tedit 5B391E66)
    (at 129.7 99)
    (descr "SMD Solder Jumper, 1x1.5mm, rounded Pads, 0.3mm gap, open")
    (tags "solder jumper open")
    (attr exclude_from_pos_files exclude_from_bom)
    (fp_text reference "JP9" (at 0 -1.8) (layer "F.SilkS"))
    (fp_text value "S" (at 0 1.9) (layer "F.Fab"))
    (pad "1" smd custom locked (at -0.65 0) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 97 "+5VP") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy 0.5 -0.75)
            (xy 0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
    (pad "2" smd custom locked (at 0.65 0) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 81 "Net-(J4-Pad3)") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy -0.5 -0.75)
            (xy -0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
  )
  (footprint "Jumper:SolderJumper-2_P1.3mm_Open_RoundedPad1.0x1.5mm" (layer "F.Cu")
    (tedit 5B391E66)
    (at 38.8 94.4 90)
    (descr "SMD Solder Jumper, 1x1.5mm, rounded Pads, 0.3mm gap, open")
    (tags "solder jumper open")
    (attr exclude_from_pos_files exclude_from_bom)
    (fp_text reference "JP51" (at 0 -1.8 90) (layer "F.SilkS"))
    (fp_text value "S" (at 0 1.9 90) (layer "F.Fab"))
    (pad "1" smd custom locked (at -0.65 0 90) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 40 "+3.3VA") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy 0.5 -0.75)
            (xy 0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
    (pad "2" smd custom locked (at 0.65 0 90) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 50 "Net-(C73-Pad2)") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy -0.5 -0.75)
            (xy -0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
  )
  (footprint "my_library:AirCoilSMD" (layer "F.Cu")
    (tedit 614C6422)
    (at 130.8 120.5 90)
    (attr through_hole)
    (fp_text reference "L1" (at -2.92368 -2.56556 90) (layer "F.SilkS"))
    (fp_text value "res" (at 3.68 -2.78 90) (layer "F.SilkS"))
    (pad "1" smd rect locked (at 3 0 90) (size 3 3) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 4 "Net-(C2-Pad2)"))
    (pad "2" smd rect locked (at -3 0 90) (size 3 3) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 2 "BiasT"))
    (model "${KISYS3DMOD}/Inductor_SMD.3dshapes/L_TDK_SLF6028.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Inductor_SMD:L_0805_2012Metric_Pad1.15x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEF0)
    (at 107.315 92.583 90)
    (descr "Inductor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "inductor handsolder")
    (attr smd)
    (fp_text reference "L2" (at -3.02514 0.3937 90) (layer "F.SilkS"))
    (fp_text value "33n" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.025 0 90) (size 1.15 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2173904348)
      (net 7 "Net-(C5-Pad2)"))
    (pad "2" smd roundrect locked (at 1.025 0 90) (size 1.15 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2173904348)
      (net 9 "Net-(C6-Pad2)"))
    (model "${KISYS3DMOD}/Inductor_SMD.3dshapes/L_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Inductor_SMD:L_0805_2012Metric_Pad1.15x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEF0)
    (at 93.9 64.875 90)
    (descr "Inductor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "inductor handsolder")
    (attr smd)
    (fp_text reference "L5" (at 0 -1.65 90) (layer "F.SilkS"))
    (fp_text value "33n" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.025 0 90) (size 1.15 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2173904348)
      (net 24 "Net-(C16-Pad2)"))
    (pad "2" smd roundrect locked (at 1.025 0 90) (size 1.15 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2173904348)
      (net 22 "Net-(C15-Pad2)"))
    (model "${KISYS3DMOD}/Inductor_SMD.3dshapes/L_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Inductor_SMD:L_0805_2012Metric_Pad1.15x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEF0)
    (at 123.72848 85.50402)
    (descr "Inductor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "inductor handsolder")
    (attr smd)
    (fp_text reference "L6" (at 3.2 0) (layer "F.SilkS"))
    (fp_text value "33n" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.025 0) (size 1.15 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2173904348)
      (net 25 "Net-(C17-Pad2)"))
    (pad "2" smd roundrect locked (at 1.025 0) (size 1.15 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2173904348)
      (net 134 "Net-(L6-Pad2)"))
    (model "${KISYS3DMOD}/Inductor_SMD.3dshapes/L_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Inductor_SMD:L_0805_2012Metric_Pad1.05x1.20mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEF0)
    (at 42.4 96 -90)
    (descr "Inductor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 80, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "inductor handsolder")
    (attr smd)
    (fp_text reference "L53" (at -0.6 1.5 90) (layer "F.SilkS"))
    (fp_text value "3n9" (at 0 1.55 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.15 0 270) (size 1.05 1.2) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2380942857)
      (net 50 "Net-(C73-Pad2)"))
    (pad "2" smd roundrect locked (at 1.15 0 270) (size 1.05 1.2) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2380942857)
      (net 56 "Net-(C89-Pad2)"))
    (model "${KISYS3DMOD}/Inductor_SMD.3dshapes/L_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Inductor_SMD:L_0805_2012Metric_Pad1.05x1.20mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEF0)
    (at 95.2 92.1 90)
    (descr "Inductor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 80, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "inductor handsolder")
    (attr smd)
    (fp_text reference "L54" (at 0.2 1.6 90) (layer "F.SilkS"))
    (fp_text value "3n9" (at 0 1.55 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.15 0 90) (size 1.05 1.2) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2380942857)
      (net 51 "Net-(C74-Pad2)"))
    (pad "2" smd roundrect locked (at 1.15 0 90) (size 1.05 1.2) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2380942857)
      (net 59 "Net-(C90-Pad2)"))
    (model "${KISYS3DMOD}/Inductor_SMD.3dshapes/L_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 103.9 95.7)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R1" (at -2.87 0.01) (layer "F.SilkS"))
    (fp_text value "12R" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 7 "Net-(C5-Pad2)"))
    (pad "2" smd roundrect locked (at 1 0) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 93 "Net-(JP1-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 61F96E4E)
    (at 110.28502 113.15954 180)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R7" (at 0 -1.65) (layer "F.SilkS"))
    (fp_text value "res" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 94 "Net-(JP2-Pad1)"))
    (pad "2" smd roundrect locked (at 1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208)
      (net 1 "GNDREF") (zone_connect 2))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 109 66.2 -90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R8" (at 0.1 1.7 90) (layer "F.SilkS"))
    (fp_text value "1K" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 16 "Net-(C11-Pad2)"))
    (pad "2" smd roundrect locked (at 1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 97 "+5VP"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 93.8 68.8 -90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R10" (at -0.2 1.7 90) (layer "F.SilkS"))
    (fp_text value "12R" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 24 "Net-(C16-Pad2)"))
    (pad "2" smd roundrect locked (at 1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 96 "Net-(JP3-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 61A096F3)
    (at 34 99.9 -90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R11" (at -0.4 -2 90) (layer "F.SilkS"))
    (fp_text value "res" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 57 "LO1"))
    (pad "2" smd roundrect locked (at 1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208)
      (net 1 "GNDREF") (zone_connect 2))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 61A096E3)
    (at 27 99.8 -90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R13" (at 3.5 -0.5 90) (layer "F.SilkS"))
    (fp_text value "res" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 74 "Net-(J2-Pad17)"))
    (pad "2" smd roundrect locked (at 1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208)
      (net 1 "GNDREF") (zone_connect 2))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 49.4 62.8)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R15" (at 0.1 1.7) (layer "F.SilkS"))
    (fp_text value "0R" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 78 "Net-(J3-Pad3)"))
    (pad "2" smd roundrect locked (at 1 0) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 23 "Net-(C15-Pad1)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 61F1A34C)
    (at 46.7 65.7 -90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R16" (at 0 2.2 90) (layer "F.SilkS"))
    (fp_text value "res" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 78 "Net-(J3-Pad3)"))
    (pad "2" smd roundrect locked (at 1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208)
      (net 1 "GNDREF") (zone_connect 2))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 120.6 94.2 180)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R17" (at 0 -1.65) (layer "F.SilkS"))
    (fp_text value "1K" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 30 "Net-(C22-Pad2)"))
    (pad "2" smd roundrect locked (at 1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 95 "+5C"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 112.284 94)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R18" (at 0.2 2) (layer "F.SilkS"))
    (fp_text value "1K" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 97 "+5VP"))
    (pad "2" smd roundrect locked (at 1 0) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 31 "Net-(C23-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 112.038 136.804)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R33" (at -3.37 0.16) (layer "F.SilkS"))
    (fp_text value "res" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 32 "Net-(C31-Pad1)"))
    (pad "2" smd roundrect locked (at 1 0) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 1 "GNDREF"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 58.954 141.273 -90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R32" (at 0 1.8 90) (layer "F.SilkS"))
    (fp_text value "2K2" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 97 "+5VP"))
    (pad "2" smd roundrect locked (at 1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 124 "Net-(D32-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 54.027 141.246 -90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R35" (at 0.2 1.7 90) (layer "F.SilkS"))
    (fp_text value "2K2" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 98 "+6V"))
    (pad "2" smd roundrect locked (at 1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 63 "Net-(D34-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 63.8 141.3 -90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R36" (at -0.1 1.8 90) (layer "F.SilkS"))
    (fp_text value "2K2" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 34 "+5V"))
    (pad "2" smd roundrect locked (at 1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 64 "Net-(D35-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 61F255B0)
    (at 74.7 99.1 -90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R51" (at 0 -1.65 90) (layer "F.SilkS"))
    (fp_text value "62R" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 88 "Net-(J51-Pad1)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 71.8 98.6)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R52" (at 0 -1.65) (layer "F.SilkS"))
    (fp_text value "270R" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 48 "Net-(C71-Pad2)"))
    (pad "2" smd roundrect locked (at 1 0) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 88 "Net-(J51-Pad1)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 61F255A5)
    (at 68.9 97.7 -90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R53" (at 0.2 1.9 90) (layer "F.SilkS"))
    (fp_text value "62R" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 48 "Net-(C71-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 50.3 103.9 90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R54" (at -3.3 -0.6 90) (layer "F.SilkS"))
    (fp_text value "5K1" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 90) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1 0 90) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 101 "Net-(R54-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 87 83.2 -90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R55" (at -3.5 0.6 90) (layer "F.SilkS"))
    (fp_text value "5K1" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 102 "Net-(R55-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 46.7 90.2 180)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R56" (at 0.1 1.5) (layer "F.SilkS"))
    (fp_text value "470R" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at 1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 53 "Net-(C83-Pad1)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 61A0C4E4)
    (at 91.2 96.8)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R57" (at 0 -1.65) (layer "F.SilkS"))
    (fp_text value "470R" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 1 0) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 55 "Net-(C84-Pad1)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 79.4 91.3)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R58" (at 0.2 1.8) (layer "F.SilkS"))
    (fp_text value "2K2" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 67 "Net-(D51-Pad2)"))
    (pad "2" smd roundrect locked (at 1 0) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 119 "Net-(JP53-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 58.3 96.7 180)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R59" (at 0 1.6) (layer "F.SilkS"))
    (fp_text value "2K2" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 68 "Net-(D52-Pad2)"))
    (pad "2" smd roundrect locked (at 1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 120 "Net-(JP54-Pad1)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_SO:MSOP-8_3x3mm_P0.65mm" (layer "F.Cu")
    (tedit 5E509FDD)
    (at 113.4 85.2 90)
    (descr "MSOP, 8 Pin (https://www.jedec.org/system/files/docs/mo-187F.pdf variant AA), generated with kicad-footprint-generator ipc_gullwing_generator.py")
    (tags "MSOP SO")
    (attr smd)
    (fp_text reference "U2" (at 0 -2.45 90) (layer "F.SilkS"))
    (fp_text value "HMC213B" (at 0 2.45 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -2.1125 -0.975 90) (size 1.625 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "2" smd roundrect locked (at -2.1125 -0.325 90) (size 1.625 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 8 "Net-(C6-Pad1)"))
    (pad "3" smd roundrect locked (at -2.1125 0.325 90) (size 1.625 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "4" smd roundrect locked (at -2.1125 0.975 90) (size 1.625 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 103 "Net-(U2-Pad4)"))
    (pad "5" smd roundrect locked (at 2.1125 0.975 90) (size 1.625 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 10 "Net-(C8-Pad1)"))
    (pad "6" smd roundrect locked (at 2.1125 0.325 90) (size 1.625 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "7" smd roundrect locked (at 2.1125 -0.325 90) (size 1.625 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 13 "Net-(C9-Pad2)"))
    (pad "8" smd roundrect locked (at 2.1125 -0.975 90) (size 1.625 0.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (model "${KISYS3DMOD}/Package_SO.3dshapes/MSOP-8_3x3mm_P0.65mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_TO_SOT_SMD:SOT-363_SC-70-6" (layer "F.Cu")
    (tedit 5A02FF57)
    (at 113 62.2 -90)
    (descr "SOT-363, SC-70-6")
    (tags "SOT-363 SC-70-6")
    (attr smd)
    (fp_text reference "U4" (at -3.2 -0.1 90) (layer "F.SilkS"))
    (fp_text value "AS179-92LF" (at 0 2 -90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd rect locked (at -0.95 -0.65 270) (size 0.65 0.4) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 21 "Net-(C14-Pad2)"))
    (pad "2" smd rect locked (at -0.95 0 270) (size 0.65 0.4) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 1 "GNDREF"))
    (pad "3" smd rect locked (at -0.95 0.65 270) (size 0.65 0.4) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 19 "Net-(C13-Pad2)"))
    (pad "4" smd rect locked (at 0.95 0.65 270) (size 0.65 0.4) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 16 "Net-(C11-Pad2)"))
    (pad "5" smd rect locked (at 0.95 0 270) (size 0.65 0.4) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 15 "Net-(C10-Pad1)"))
    (pad "6" smd rect locked (at 0.95 -0.65 270) (size 0.65 0.4) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 17 "Net-(C12-Pad2)"))
    (model "${KISYS3DMOD}/Package_TO_SOT_SMD.3dshapes/SOT-363_SC-70-6.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_TO_SOT_SMD:SOT-89-3" (layer "F.Cu")
    (tedit 5C33D6E8)
    (at 126.8 89.2 180)
    (descr "SOT-89-3, http://ww1.microchip.com/downloads/en/DeviceDoc/3L_SOT-89_MB_C04-029C.pdf")
    (tags "SOT-89-3")
    (attr smd)
    (fp_text reference "U6" (at 0.3 -3.5) (layer "F.SilkS"))
    (fp_text value "MGA-86576" (at 0.3 3.5) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0.5 0 90) (layer "F.Fab"))
    (pad "1" smd rect locked (at -1.65 -1.5 180) (size 1.3 0.9) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 26 "Net-(C20-Pad2)"))
    (pad "2" smd custom locked (at -1.5625 0 180) (size 1.475 0.9) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 1 "GNDREF") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_poly (pts
            (xy 0.7375 -0.8665)
            (xy 3.8625 -0.8665)
            (xy 3.8625 0.8665)
            (xy 0.7375 0.8665)
          ) (width 0) (fill yes))
      ))
    (pad "3" smd rect locked (at -1.65 1.5 180) (size 1.3 0.9) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 20 "Net-(C14-Pad1)"))
    (model "${KISYS3DMOD}/Package_TO_SOT_SMD.3dshapes/SOT-89-3.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_TO_SOT_SMD:SOT-363_SC-70-6" (layer "F.Cu")
    (tedit 5A02FF57)
    (at 116.9 92.9 90)
    (descr "SOT-363, SC-70-6")
    (tags "SOT-363 SC-70-6")
    (attr smd)
    (fp_text reference "U7" (at -1.13 -1.93 90) (layer "F.SilkS"))
    (fp_text value "AS179-92LF" (at 0 2 270) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd rect locked (at -0.95 -0.65 90) (size 0.65 0.4) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 29 "Net-(C21-Pad1)"))
    (pad "2" smd rect locked (at -0.95 0 90) (size 0.65 0.4) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 1 "GNDREF"))
    (pad "3" smd rect locked (at -0.95 0.65 90) (size 0.65 0.4) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 6 "Net-(C4-Pad1)"))
    (pad "4" smd rect locked (at 0.95 0.65 90) (size 0.65 0.4) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 30 "Net-(C22-Pad2)"))
    (pad "5" smd rect locked (at 0.95 0 90) (size 0.65 0.4) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 11 "Net-(C8-Pad2)"))
    (pad "6" smd rect locked (at 0.95 -0.65 90) (size 0.65 0.4) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 31 "Net-(C23-Pad2)"))
    (model "${KISYS3DMOD}/Package_TO_SOT_SMD.3dshapes/SOT-363_SC-70-6.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_SO:SOIJ-8_5.3x5.3mm_P1.27mm" (layer "F.Cu")
    (tedit 5A02F2D3)
    (at 65 88.1)
    (descr "8-Lead Plastic Small Outline (SM) - Medium, 5.28 mm Body [SOIC] (see Microchip Packaging Specification 00000049BS.pdf)")
    (tags "SOIC 1.27")
    (attr smd)
    (fp_text reference "U51" (at -1.7 -3.8) (layer "F.SilkS"))
    (fp_text value "ATtiny85-20SU" (at 0 3.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd rect locked (at -3.65 -1.905) (size 1.7 0.65) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 91 "Net-(J52-Pad5)"))
    (pad "2" smd rect locked (at -3.65 -0.635) (size 1.7 0.65) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 104 "Net-(U51-Pad2)"))
    (pad "3" smd rect locked (at -3.65 0.635) (size 1.7 0.65) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 105 "Net-(U51-Pad3)"))
    (pad "4" smd rect locked (at -3.65 1.905) (size 1.7 0.65) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 1 "GNDREF"))
    (pad "5" smd rect locked (at 3.65 1.905) (size 1.7 0.65) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 92 "Net-(J52-Pad4)"))
    (pad "6" smd rect locked (at 3.65 0.635) (size 1.7 0.65) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 89 "Net-(J52-Pad1)"))
    (pad "7" smd rect locked (at 3.65 -0.635) (size 1.7 0.65) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 90 "Net-(J52-Pad3)"))
    (pad "8" smd rect locked (at 3.65 -1.905) (size 1.7 0.65) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 40 "+3.3VA"))
    (model "${KISYS3DMOD}/Package_SO.3dshapes/SOIJ-8_5.3x5.3mm_P1.27mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_CSP:LFCSP-32-1EP_5x5mm_P0.5mm_EP3.1x3.1mm_ThermalVias" (layer "F.Cu")
    (tedit 61A09645)
    (at 49.755001 98.365001 -90)
    (descr "LFCSP, 32 Pin (https://www.analog.com/media/en/package-pcb-resources/package/414143737956480539664569cp_32_2.pdf), generated with kicad-footprint-generator ipc_noLead_generator.py")
    (tags "LFCSP NoLead")
    (attr smd)
    (fp_text reference "U53" (at -0.015001 -4.544999) (layer "F.SilkS"))
    (fp_text value "ADF4351" (at 0 3.8 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "" smd custom locked (at 0 -0.866667 270) (size 0.656835 0.656835) (layers "F.Paste")
      (options (clearance outline) (anchor circle))
      (primitives
        (gr_poly (pts
            (xy -0.240285 -0.094263)
            (xy -0.094263 -0.240285)
            (xy 0.094263 -0.240285)
            (xy 0.240285 -0.094263)
            (xy 0.240285 0.094263)
            (xy 0.094263 0.240285)
            (xy -0.094263 0.240285)
            (xy -0.240285 0.094263)
          ) (width 0.35253) (fill yes))
      ))
    (pad "" smd custom locked (at 0.866667 0 270) (size 0.656835 0.656835) (layers "F.Paste")
      (options (clearance outline) (anchor circle))
      (primitives
        (gr_poly (pts
            (xy -0.240285 -0.094263)
            (xy -0.094263 -0.240285)
            (xy 0.094263 -0.240285)
            (xy 0.240285 -0.094263)
            (xy 0.240285 0.094263)
            (xy 0.094263 0.240285)
            (xy -0.094263 0.240285)
            (xy -0.240285 0.094263)
          ) (width 0.35253) (fill yes))
      ))
    (pad "" smd custom locked (at 0.866667 -0.866667 270) (size 0.656835 0.656835) (layers "F.Paste")
      (options (clearance outline) (anchor circle))
      (primitives
        (gr_poly (pts
            (xy -0.240285 -0.094263)
            (xy -0.094263 -0.240285)
            (xy 0.094263 -0.240285)
            (xy 0.240285 -0.094263)
            (xy 0.240285 0.094263)
            (xy 0.094263 0.240285)
            (xy -0.094263 0.240285)
            (xy -0.240285 0.094263)
          ) (width 0.35253) (fill yes))
      ))
    (pad "" smd custom locked (at 0 0 270) (size 0.656835 0.656835) (layers "F.Paste")
      (options (clearance outline) (anchor circle))
      (primitives
        (gr_poly (pts
            (xy -0.240285 -0.094263)
            (xy -0.094263 -0.240285)
            (xy 0.094263 -0.240285)
            (xy 0.240285 -0.094263)
            (xy 0.240285 0.094263)
            (xy 0.094263 0.240285)
            (xy -0.094263 0.240285)
            (xy -0.240285 0.094263)
          ) (width 0.35253) (fill yes))
      ))
    (pad "" smd custom locked (at 0 0.866667 270) (size 0.656835 0.656835) (layers "F.Paste")
      (options (clearance outline) (anchor circle))
      (primitives
        (gr_poly (pts
            (xy -0.240285 -0.094263)
            (xy -0.094263 -0.240285)
            (xy 0.094263 -0.240285)
            (xy 0.240285 -0.094263)
            (xy 0.240285 0.094263)
            (xy 0.094263 0.240285)
            (xy -0.094263 0.240285)
            (xy -0.240285 0.094263)
          ) (width 0.35253) (fill yes))
      ))
    (pad "" smd custom locked (at 0.866667 0.866667 270) (size 0.656835 0.656835) (layers "F.Paste")
      (options (clearance outline) (anchor circle))
      (primitives
        (gr_poly (pts
            (xy -0.240285 -0.094263)
            (xy -0.094263 -0.240285)
            (xy 0.094263 -0.240285)
            (xy 0.240285 -0.094263)
            (xy 0.240285 0.094263)
            (xy 0.094263 0.240285)
            (xy -0.094263 0.240285)
            (xy -0.240285 0.094263)
          ) (width 0.35253) (fill yes))
      ))
    (pad "" smd custom locked (at -0.866667 0.866667 270) (size 0.656835 0.656835) (layers "F.Paste")
      (options (clearance outline) (anchor circle))
      (primitives
        (gr_poly (pts
            (xy -0.240285 -0.094263)
            (xy -0.094263 -0.240285)
            (xy 0.094263 -0.240285)
            (xy 0.240285 -0.094263)
            (xy 0.240285 0.094263)
            (xy 0.094263 0.240285)
            (xy -0.094263 0.240285)
            (xy -0.240285 0.094263)
          ) (width 0.35253) (fill yes))
      ))
    (pad "" smd custom locked (at -0.866667 0 270) (size 0.656835 0.656835) (layers "F.Paste")
      (options (clearance outline) (anchor circle))
      (primitives
        (gr_poly (pts
            (xy -0.240285 -0.094263)
            (xy -0.094263 -0.240285)
            (xy 0.094263 -0.240285)
            (xy 0.240285 -0.094263)
            (xy 0.240285 0.094263)
            (xy 0.094263 0.240285)
            (xy -0.094263 0.240285)
            (xy -0.240285 0.094263)
          ) (width 0.35253) (fill yes))
      ))
    (pad "" smd custom locked (at -0.866667 -0.866667 270) (size 0.656835 0.656835) (layers "F.Paste")
      (options (clearance outline) (anchor circle))
      (primitives
        (gr_poly (pts
            (xy -0.240285 -0.094263)
            (xy -0.094263 -0.240285)
            (xy 0.094263 -0.240285)
            (xy 0.240285 -0.094263)
            (xy 0.240285 0.094263)
            (xy 0.094263 0.240285)
            (xy -0.094263 0.240285)
            (xy -0.240285 0.094263)
          ) (width 0.35253) (fill yes))
      ))
    (pad "1" smd roundrect locked (at -2.4375 -1.75 270) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 90 "Net-(J52-Pad3)"))
    (pad "2" smd roundrect locked (at -2.4375 -1.25 270) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 89 "Net-(J52-Pad1)"))
    (pad "3" smd roundrect locked (at -2.4375 -0.75 270) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 104 "Net-(U51-Pad2)"))
    (pad "4" smd roundrect locked (at -2.4375 -0.25 270) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 117 "Net-(C60-Pad2)"))
    (pad "5" smd roundrect locked (at -2.4375 0.25 270) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 106 "Net-(U53-Pad5)"))
    (pad "6" smd roundrect locked (at -2.4375 0.75 270) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 50 "Net-(C73-Pad2)"))
    (pad "7" smd roundrect locked (at -2.4375 1.25 270) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 52 "Net-(C83-Pad2)"))
    (pad "8" smd roundrect locked (at -2.4375 1.75 270) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "9" smd roundrect locked (at -1.75 2.4375 270) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "10" smd roundrect locked (at -1.25 2.4375 270) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 50 "Net-(C73-Pad2)"))
    (pad "11" smd roundrect locked (at -0.75 2.4375 270) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "12" smd roundrect locked (at -0.25 2.4375 270) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 56 "Net-(C89-Pad2)"))
    (pad "13" smd roundrect locked (at 0.25 2.4375 270) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 107 "Net-(U53-Pad13)"))
    (pad "14" smd roundrect locked (at 0.75 2.4375 270) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 108 "Net-(U53-Pad14)"))
    (pad "15" smd roundrect locked (at 1.25 2.4375 270) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 109 "Net-(U53-Pad15)"))
    (pad "16" smd roundrect locked (at 1.75 2.4375 270) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 50 "Net-(C73-Pad2)"))
    (pad "17" smd roundrect locked (at 2.4375 1.75 270) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 50 "Net-(C73-Pad2)"))
    (pad "18" smd roundrect locked (at 2.4375 1.25 270) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "19" smd roundrect locked (at 2.4375 0.75 270) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 41 "Net-(C58-Pad2)"))
    (pad "20" smd roundrect locked (at 2.4375 0.25 270) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 60 "Net-(C92-Pad2)"))
    (pad "21" smd roundrect locked (at 2.4375 -0.25 270) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "22" smd roundrect locked (at 2.4375 -0.75 270) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 101 "Net-(R54-Pad2)"))
    (pad "23" smd roundrect locked (at 2.4375 -1.25 270) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 43 "Net-(C63-Pad2)"))
    (pad "24" smd roundrect locked (at 2.4375 -1.75 270) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 45 "Net-(C67-Pad2)"))
    (pad "25" smd roundrect locked (at 1.75 -2.4375 270) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 110 "Net-(U53-Pad25)"))
    (pad "26" smd roundrect locked (at 1.25 -2.4375 270) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 117 "Net-(C60-Pad2)"))
    (pad "27" smd roundrect locked (at 0.75 -2.4375 270) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "28" smd roundrect locked (at 0.25 -2.4375 270) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 117 "Net-(C60-Pad2)"))
    (pad "29" smd roundrect locked (at -0.25 -2.4375 270) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 47 "Net-(C71-Pad1)"))
    (pad "30" smd roundrect locked (at -0.75 -2.4375 270) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 120 "Net-(JP54-Pad1)"))
    (pad "31" smd roundrect locked (at -1.25 -2.4375 270) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "32" smd roundrect locked (at -1.75 -2.4375 270) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 117 "Net-(C60-Pad2)"))
    (pad "33" thru_hole circle locked (at -0.433333 -1.3 270) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at -0.433333 -0.433333 270) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at 1.3 -0.433333 270) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at 0.433333 -0.433333 270) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at -0.433333 1.3 270) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" smd rect locked (at 0 0 270) (size 3.1 3.1) (layers "B.Cu")
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at -0.433333 0.433333 270) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at -1.3 0.433333 270) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at 1.3 0.433333 270) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at 0.433333 1.3 270) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at 1.3 1.3 270) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at 0.433333 0.433333 270) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" smd rect locked (at 0 0 270) (size 3.1 3.1) (layers "F.Cu" "F.Mask")
      (net 1 "GNDREF"))
    (pad "33" thru_hole circle locked (at -1.3 -1.3 270) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at 0.433333 -1.3 270) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at -1.3 -0.433333 270) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at -1.3 1.3 270) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at 1.3 -1.3 270) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (model "${KISYS3DMOD}/Package_CSP.3dshapes/LFCSP-32-1EP_5x5mm_P0.5mm_EP3.1x3.1mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_CSP:LFCSP-32-1EP_5x5mm_P0.5mm_EP3.1x3.1mm_ThermalVias" (layer "F.Cu")
    (tedit 61A09837)
    (at 87.8 88.8 90)
    (descr "LFCSP, 32 Pin (https://www.analog.com/media/en/package-pcb-resources/package/414143737956480539664569cp_32_2.pdf), generated with kicad-footprint-generator ipc_noLead_generator.py")
    (tags "LFCSP NoLead")
    (zone_connect 2)
    (attr smd)
    (fp_text reference "U54" (at -5 -2.4 90) (layer "F.SilkS"))
    (fp_text value "ADF4351" (at 0 3.8 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "" smd custom locked (at 0 0.866667 90) (size 0.656835 0.656835) (layers "F.Paste")
      (zone_connect 2)
      (options (clearance outline) (anchor circle))
      (primitives
        (gr_poly (pts
            (xy -0.240285 -0.094263)
            (xy -0.094263 -0.240285)
            (xy 0.094263 -0.240285)
            (xy 0.240285 -0.094263)
            (xy 0.240285 0.094263)
            (xy 0.094263 0.240285)
            (xy -0.094263 0.240285)
            (xy -0.240285 0.094263)
          ) (width 0.35253) (fill yes))
      ))
    (pad "" smd custom locked (at 0.866667 0.866667 90) (size 0.656835 0.656835) (layers "F.Paste")
      (zone_connect 2)
      (options (clearance outline) (anchor circle))
      (primitives
        (gr_poly (pts
            (xy -0.240285 -0.094263)
            (xy -0.094263 -0.240285)
            (xy 0.094263 -0.240285)
            (xy 0.240285 -0.094263)
            (xy 0.240285 0.094263)
            (xy 0.094263 0.240285)
            (xy -0.094263 0.240285)
            (xy -0.240285 0.094263)
          ) (width 0.35253) (fill yes))
      ))
    (pad "" smd custom locked (at 0 -0.866667 90) (size 0.656835 0.656835) (layers "F.Paste")
      (zone_connect 2)
      (options (clearance outline) (anchor circle))
      (primitives
        (gr_poly (pts
            (xy -0.240285 -0.094263)
            (xy -0.094263 -0.240285)
            (xy 0.094263 -0.240285)
            (xy 0.240285 -0.094263)
            (xy 0.240285 0.094263)
            (xy 0.094263 0.240285)
            (xy -0.094263 0.240285)
            (xy -0.240285 0.094263)
          ) (width 0.35253) (fill yes))
      ))
    (pad "" smd custom locked (at 0.866667 -0.866667 90) (size 0.656835 0.656835) (layers "F.Paste")
      (zone_connect 2)
      (options (clearance outline) (anchor circle))
      (primitives
        (gr_poly (pts
            (xy -0.240285 -0.094263)
            (xy -0.094263 -0.240285)
            (xy 0.094263 -0.240285)
            (xy 0.240285 -0.094263)
            (xy 0.240285 0.094263)
            (xy 0.094263 0.240285)
            (xy -0.094263 0.240285)
            (xy -0.240285 0.094263)
          ) (width 0.35253) (fill yes))
      ))
    (pad "" smd custom locked (at -0.866667 -0.866667 90) (size 0.656835 0.656835) (layers "F.Paste")
      (zone_connect 2)
      (options (clearance outline) (anchor circle))
      (primitives
        (gr_poly (pts
            (xy -0.240285 -0.094263)
            (xy -0.094263 -0.240285)
            (xy 0.094263 -0.240285)
            (xy 0.240285 -0.094263)
            (xy 0.240285 0.094263)
            (xy 0.094263 0.240285)
            (xy -0.094263 0.240285)
            (xy -0.240285 0.094263)
          ) (width 0.35253) (fill yes))
      ))
    (pad "" smd custom locked (at -0.866667 0 90) (size 0.656835 0.656835) (layers "F.Paste")
      (zone_connect 2)
      (options (clearance outline) (anchor circle))
      (primitives
        (gr_poly (pts
            (xy -0.240285 -0.094263)
            (xy -0.094263 -0.240285)
            (xy 0.094263 -0.240285)
            (xy 0.240285 -0.094263)
            (xy 0.240285 0.094263)
            (xy 0.094263 0.240285)
            (xy -0.094263 0.240285)
            (xy -0.240285 0.094263)
          ) (width 0.35253) (fill yes))
      ))
    (pad "" smd custom locked (at 0.866667 0 90) (size 0.656835 0.656835) (layers "F.Paste")
      (zone_connect 2)
      (options (clearance outline) (anchor circle))
      (primitives
        (gr_poly (pts
            (xy -0.240285 -0.094263)
            (xy -0.094263 -0.240285)
            (xy 0.094263 -0.240285)
            (xy 0.240285 -0.094263)
            (xy 0.240285 0.094263)
            (xy 0.094263 0.240285)
            (xy -0.094263 0.240285)
            (xy -0.240285 0.094263)
          ) (width 0.35253) (fill yes))
      ))
    (pad "" smd custom locked (at -0.866667 0.866667 90) (size 0.656835 0.656835) (layers "F.Paste")
      (zone_connect 2)
      (options (clearance outline) (anchor circle))
      (primitives
        (gr_poly (pts
            (xy -0.240285 -0.094263)
            (xy -0.094263 -0.240285)
            (xy 0.094263 -0.240285)
            (xy 0.240285 -0.094263)
            (xy 0.240285 0.094263)
            (xy 0.094263 0.240285)
            (xy -0.094263 0.240285)
            (xy -0.240285 0.094263)
          ) (width 0.35253) (fill yes))
      ))
    (pad "" smd custom locked (at 0 0 90) (size 0.656835 0.656835) (layers "F.Paste")
      (zone_connect 2)
      (options (clearance outline) (anchor circle))
      (primitives
        (gr_poly (pts
            (xy -0.240285 -0.094263)
            (xy -0.094263 -0.240285)
            (xy 0.094263 -0.240285)
            (xy 0.240285 -0.094263)
            (xy 0.240285 0.094263)
            (xy 0.094263 0.240285)
            (xy -0.094263 0.240285)
            (xy -0.240285 0.094263)
          ) (width 0.35253) (fill yes))
      ))
    (pad "1" smd roundrect locked (at -2.4375 -1.75 90) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 90 "Net-(J52-Pad3)") (zone_connect 2))
    (pad "2" smd roundrect locked (at -2.4375 -1.25 90) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 89 "Net-(J52-Pad1)") (zone_connect 2))
    (pad "3" smd roundrect locked (at -2.4375 -0.75 90) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 105 "Net-(U51-Pad3)") (zone_connect 2))
    (pad "4" smd roundrect locked (at -2.4375 -0.25 90) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 116 "Net-(C56-Pad2)") (zone_connect 2))
    (pad "5" smd roundrect locked (at -2.4375 0.25 90) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 115 "Net-(U54-Pad5)") (zone_connect 2))
    (pad "6" smd roundrect locked (at -2.4375 0.75 90) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 51 "Net-(C74-Pad2)") (zone_connect 2))
    (pad "7" smd roundrect locked (at -2.4375 1.25 90) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 54 "Net-(C84-Pad2)") (zone_connect 2))
    (pad "8" smd roundrect locked (at -2.4375 1.75 90) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "9" smd roundrect locked (at -1.75 2.4375 90) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "10" smd roundrect locked (at -1.25 2.4375 90) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 51 "Net-(C74-Pad2)") (zone_connect 2))
    (pad "11" smd roundrect locked (at -0.75 2.4375 90) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "12" smd roundrect locked (at -0.25 2.4375 90) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 59 "Net-(C90-Pad2)") (zone_connect 2))
    (pad "13" smd roundrect locked (at 0.25 2.4375 90) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 114 "Net-(U54-Pad13)") (zone_connect 2))
    (pad "14" smd roundrect locked (at 0.75 2.4375 90) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 113 "Net-(U54-Pad14)") (zone_connect 2))
    (pad "15" smd roundrect locked (at 1.25 2.4375 90) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 112 "Net-(U54-Pad15)") (zone_connect 2))
    (pad "16" smd roundrect locked (at 1.75 2.4375 90) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 51 "Net-(C74-Pad2)") (zone_connect 2))
    (pad "17" smd roundrect locked (at 2.4375 1.75 90) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 51 "Net-(C74-Pad2)") (zone_connect 2))
    (pad "18" smd roundrect locked (at 2.4375 1.25 90) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "19" smd roundrect locked (at 2.4375 0.75 90) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 42 "Net-(C59-Pad2)") (zone_connect 2))
    (pad "20" smd roundrect locked (at 2.4375 0.25 90) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 61 "Net-(C93-Pad2)") (zone_connect 2))
    (pad "21" smd roundrect locked (at 2.4375 -0.25 90) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "22" smd roundrect locked (at 2.4375 -0.75 90) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 102 "Net-(R55-Pad2)") (zone_connect 2))
    (pad "23" smd roundrect locked (at 2.4375 -1.25 90) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 44 "Net-(C64-Pad2)") (zone_connect 2))
    (pad "24" smd roundrect locked (at 2.4375 -1.75 90) (size 0.825 0.25) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 46 "Net-(C68-Pad2)") (zone_connect 2))
    (pad "25" smd roundrect locked (at 1.75 -2.4375 90) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 111 "Net-(U54-Pad25)") (zone_connect 2))
    (pad "26" smd roundrect locked (at 1.25 -2.4375 90) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 116 "Net-(C56-Pad2)") (zone_connect 2))
    (pad "27" smd roundrect locked (at 0.75 -2.4375 90) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "28" smd roundrect locked (at 0.25 -2.4375 90) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 116 "Net-(C56-Pad2)") (zone_connect 2))
    (pad "29" smd roundrect locked (at -0.25 -2.4375 90) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 49 "Net-(C72-Pad1)") (zone_connect 2))
    (pad "30" smd roundrect locked (at -0.75 -2.4375 90) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 119 "Net-(JP53-Pad2)") (zone_connect 2))
    (pad "31" smd roundrect locked (at -1.25 -2.4375 90) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "32" smd roundrect locked (at -1.75 -2.4375 90) (size 0.25 0.825) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 116 "Net-(C56-Pad2)") (zone_connect 2))
    (pad "33" thru_hole circle locked (at 1.3 -1.3 90) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at 0.433333 -1.3 90) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at 0.433333 1.3 90) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" smd rect locked (at 0 0 90) (size 3.1 3.1) (layers "B.Cu")
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at 1.3 -0.433333 90) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at -1.3 -0.433333 90) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at -1.3 -1.3 90) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at 0.433333 -0.433333 90) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at -0.433333 0.433333 90) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" smd rect locked (at 0 0 90) (size 3.1 3.1) (layers "F.Cu" "F.Mask")
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at -0.433333 -1.3 90) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at -0.433333 -0.433333 90) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at 1.3 0.433333 90) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at 1.3 1.3 90) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at -1.3 0.433333 90) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at -1.3 1.3 90) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at -0.433333 1.3 90) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "33" thru_hole circle locked (at 0.433333 0.433333 90) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (model "${KISYS3DMOD}/Package_CSP.3dshapes/LFCSP-32-1EP_5x5mm_P0.5mm_EP3.1x3.1mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Potentiometer_SMD:Potentiometer_Vishay_TS53YJ_Vertical" (layer "F.Cu")
    (tedit 61F96E46)
    (at 112.06226 108.26242 -90)
    (descr "Potentiometer, vertical, Vishay TS53YJ, https://www.vishay.com/docs/51008/ts53.pdf")
    (tags "Potentiometer vertical Vishay TS53YJ")
    (attr smd)
    (fp_text reference "RV1" (at 0.0508 3.7592 90) (layer "F.SilkS"))
    (fp_text value "res" (at 0 3.75 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 -2 90) (layer "F.Fab"))
    (pad "1" smd rect locked (at 2 -1.15 270) (size 2 1.3) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 94 "Net-(JP2-Pad1)"))
    (pad "2" smd rect locked (at -2 0 270) (size 2 2) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 136 "Net-(JP2-Pad2)"))
    (pad "3" smd rect locked (at 2 1.15 270) (size 2 1.3) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 1 "GNDREF") (zone_connect 2))
    (model "${KISYS3DMOD}/Potentiometer_SMD.3dshapes/Potentiometer_Vishay_TS53YJ_Vertical.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_TO_SOT_SMD:SOT-89-3_Handsoldering" (layer "F.Cu")
    (tedit 5C33D6DD)
    (at 104.2 87 90)
    (descr "SOT-89-3 Handsoldering")
    (tags "SOT-89-3 Handsoldering")
    (attr smd)
    (fp_text reference "U1" (at 0.3 -3.5 90) (layer "F.SilkS"))
    (fp_text value "SBB3089Z" (at 0.3 3.5 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0.5 0) (layer "F.Fab"))
    (pad "1" smd rect locked (at -2.15 -1.5 90) (size 2.3 0.9) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 58 "LO2"))
    (pad "2" smd custom locked (at -2.0625 0 90) (size 2.475 0.9) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 1 "GNDREF") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_poly (pts
            (xy 1.2375 -0.8665)
            (xy 5.3625 -0.8665)
            (xy 5.3625 0.8665)
            (xy 1.2375 0.8665)
          ) (width 0) (fill yes))
      ))
    (pad "3" smd rect locked (at -2.15 1.5 90) (size 2.3 0.9) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 9 "Net-(C6-Pad2)"))
    (model "${KISYS3DMOD}/Package_TO_SOT_SMD.3dshapes/SOT-89-3.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "my_library:LFSN25N" (layer "F.Cu")
    (tedit 61A0C2BE)
    (at 113.05 73.4 90)
    (attr through_hole)
    (fp_text reference "U3" (at 0 2.794 90) (layer "F.SilkS"))
    (fp_text value "LFB2H2G45SG7C093" (at 0 -2.794 90) (layer "F.Fab"))
    (pad "1" smd circle locked (at -1.6 0 90) (size 0.6 0.6) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 12 "Net-(C9-Pad1)"))
    (pad "2" smd circle locked (at 1.6 0 90) (size 0.6 0.6) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 14 "Net-(C10-Pad2)"))
    (pad "3" smd rect locked (at 0 1.25 90) (size 3.2 0.5) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 1 "GNDREF") (zone_connect 2))
    (pad "4" smd rect locked (at 0 -1.25 90) (size 3.2 0.5) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 1 "GNDREF") (zone_connect 2))
  )
  (footprint "Package_TO_SOT_SMD:SOT-89-3_Handsoldering" (layer "F.Cu")
    (tedit 5C33D6DD)
    (at 99.7 63.4 -90)
    (descr "SOT-89-3 Handsoldering")
    (tags "SOT-89-3 Handsoldering")
    (attr smd)
    (fp_text reference "U5" (at 0.3 -3.5 90) (layer "F.SilkS"))
    (fp_text value "SBB3089Z" (at 0.3 3.5 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0.5 0) (layer "F.Fab"))
    (pad "1" smd rect locked (at -2.15 -1.5 270) (size 2.3 0.9) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 18 "Net-(C13-Pad1)"))
    (pad "2" smd custom locked (at -2.0625 0 270) (size 2.475 0.9) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 1 "GNDREF") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_poly (pts
            (xy 1.2375 -0.8665)
            (xy 5.3625 -0.8665)
            (xy 5.3625 0.8665)
            (xy 1.2375 0.8665)
          ) (width 0) (fill yes))
      ))
    (pad "3" smd rect locked (at -2.15 1.5 270) (size 2.3 0.9) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 22 "Net-(C15-Pad2)"))
    (model "${KISYS3DMOD}/Package_TO_SOT_SMD.3dshapes/SOT-89-3.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0603_1608Metric_Pad1.08x0.95mm_HandSolder" (layer "F.Cu")
    (tedit 61A0C655)
    (at 54.6375 100.2 180)
    (descr "Capacitor SMD 0603 (1608 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C81" (at -3.4625 -0.5) (layer "F.SilkS"))
    (fp_text value "100p" (at 0 1.43) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -0.8625 0 180) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 0.8625 0 180) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 117 "Net-(C60-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0603_1608Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0603_1608Metric_Pad1.08x0.95mm_HandSolder" (layer "F.Cu")
    (tedit 61A0C45A)
    (at 82.7 87.4)
    (descr "Capacitor SMD 0603 (1608 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C82" (at 0 1.5) (layer "F.SilkS"))
    (fp_text value "100p" (at 0 1.43) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -0.8625 0) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 0.8625 0) (size 1.075 0.95) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 116 "Net-(C56-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0603_1608Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_1206_3216Metric_Pad1.30x1.75mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 118.66794 112.2225 90)
    (descr "Resistor SMD 1206 (3216 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R2" (at 3.7264 -0.15916 90) (layer "F.SilkS"))
    (fp_text value "220R" (at 0 1.82 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.55 0 90) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.1923076923)
      (net 3 "Net-(C2-Pad1)"))
    (pad "2" smd roundrect locked (at 1.55 0 90) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.1923076923)
      (net 5 "Net-(C4-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_1206_3216Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_1206_3216Metric_Pad1.30x1.75mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 121.63298 112.2807 90)
    (descr "Resistor SMD 1206 (3216 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R3" (at 3.67 -1.29 90) (layer "F.SilkS"))
    (fp_text value "220R" (at 0 1.82 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.55 0 90) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.1923076923)
      (net 3 "Net-(C2-Pad1)"))
    (pad "2" smd roundrect locked (at 1.55 0 90) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.1923076923)
      (net 5 "Net-(C4-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_1206_3216Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_1206_3216Metric_Pad1.30x1.75mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 124.33554 112.18926 90)
    (descr "Resistor SMD 1206 (3216 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R4" (at 3.53822 0.85598 90) (layer "F.SilkS"))
    (fp_text value "220R" (at 0 1.82 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.55 0 90) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.1923076923)
      (net 3 "Net-(C2-Pad1)"))
    (pad "2" smd roundrect locked (at 1.55 0 90) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.1923076923)
      (net 5 "Net-(C4-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_1206_3216Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_1206_3216Metric_Pad1.30x1.75mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 127.12954 112.141 90)
    (descr "Resistor SMD 1206 (3216 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R5" (at 3.48996 -0.0127 90) (layer "F.SilkS"))
    (fp_text value "220R" (at 0 1.82 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.55 0 90) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.1923076923)
      (net 3 "Net-(C2-Pad1)"))
    (pad "2" smd roundrect locked (at 1.55 0 90) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.1923076923)
      (net 5 "Net-(C4-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_1206_3216Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_1206_3216Metric_Pad1.30x1.75mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 113 65.4)
    (descr "Resistor SMD 1206 (3216 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R9" (at 3.5 -0.1) (layer "F.SilkS"))
    (fp_text value "1K" (at 0 1.82) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.55 0) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.1923076923)
      (net 95 "+5C"))
    (pad "2" smd roundrect locked (at 1.55 0) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.1923076923)
      (net 17 "Net-(C12-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_1206_3216Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_1206_3216Metric_Pad1.30x1.75mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 30.5 99.1)
    (descr "Resistor SMD 1206 (3216 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R12" (at 0 -1.82) (layer "F.SilkS"))
    (fp_text value "0R" (at 0 1.82) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.55 0) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.1923076923)
      (net 74 "Net-(J2-Pad17)"))
    (pad "2" smd roundrect locked (at 1.55 0) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.1923076923)
      (net 57 "LO1"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_1206_3216Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Fiducial:Fiducial_1.5mm_Mask4.5mm" (layer "F.Cu")
    (tedit 5C18D1F6)
    (at 24 144)
    (descr "Circular Fiducial, 1.5mm bare copper, 4.5mm soldermask opening")
    (tags "fiducial")
    (attr smd)
    (fp_text reference "REF**" (at 0 -3.175) (layer "F.SilkS"))
    (fp_text value "Fiducial_1.5mm_Mask4.5mm" (at 0 3.175) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "" smd circle locked (at 0 0) (size 1.5 1.5) (layers "F.Cu" "F.Mask")
      (solder_mask_margin 1.5) (clearance 1.5))
  )
  (footprint "Fiducial:Fiducial_1.5mm_Mask4.5mm" (layer "F.Cu")
    (tedit 5C18D1F6)
    (at 126 60)
    (descr "Circular Fiducial, 1.5mm bare copper, 4.5mm soldermask opening")
    (tags "fiducial")
    (attr smd)
    (fp_text reference "REF**" (at 0 -3.175) (layer "F.SilkS"))
    (fp_text value "Fiducial_1.5mm_Mask4.5mm" (at 0 3.175) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "" smd circle locked (at 0 0) (size 1.5 1.5) (layers "F.Cu" "F.Mask")
      (solder_mask_margin 1.5) (clearance 1.5))
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 61A0C646)
    (at 55.6 103.4 90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C67" (at 0.2 1.7 90) (layer "F.SilkS"))
    (fp_text value "100n" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.213)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 45 "Net-(C67-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 61F1A357)
    (at 52.2 65.7 -90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R14" (at 0 -2 90) (layer "F.SilkS"))
    (fp_text value "res" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 23 "Net-(C15-Pad1)"))
    (pad "2" smd roundrect locked (at 1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208)
      (net 1 "GNDREF") (zone_connect 2))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 48.7 141.1 -90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R31" (at 0.2 1.9 90) (layer "F.SilkS"))
    (fp_text value "2K2" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 36 "-5V"))
    (pad "2" smd roundrect locked (at 1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2083325)
      (net 62 "Net-(D31-Pad1)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 61F3133A)
    (at 85.9 105.9)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C52" (at 0 -1.68) (layer "F.SilkS"))
    (fp_text value "10u" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.213)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" smd roundrect locked (at 1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2127659574)
      (net 34 "+5V"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_SO:SOIC-8-1EP_3.9x4.9mm_P1.27mm_EP2.29x3mm_ThermalVias" (layer "F.Cu")
    (tedit 61EB11B4)
    (at 84.1 109.9)
    (descr "SOIC, 8 Pin (https://www.analog.com/media/en/technical-documentation/data-sheets/ada4898-1_4898-2.pdf#page=29), generated with kicad-footprint-generator ipc_gullwing_generator.py")
    (tags "SOIC SO")
    (zone_connect 2)
    (attr smd)
    (fp_text reference "U52" (at 5.4 -2.4) (layer "F.SilkS"))
    (fp_text value "ADM7150DZ-3V3" (at 0 3.4) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "" smd roundrect locked (at -0.57 -0.75) (size 0.96 1.25) (layers "F.Paste") (roundrect_rratio 0.25)
      (zone_connect 2))
    (pad "" smd roundrect locked (at 0.57 0.75) (size 0.96 1.25) (layers "F.Paste") (roundrect_rratio 0.25)
      (zone_connect 2))
    (pad "" smd roundrect locked (at 0.57 -0.75) (size 0.96 1.25) (layers "F.Paste") (roundrect_rratio 0.25)
      (zone_connect 2))
    (pad "" smd roundrect locked (at -0.57 0.75) (size 0.96 1.25) (layers "F.Paste") (roundrect_rratio 0.25)
      (zone_connect 2))
    (pad "1" smd roundrect locked (at -2.475 -1.905) (size 1.95 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 38 "Net-(C54-Pad2)") (zone_connect 2))
    (pad "2" smd roundrect locked (at -2.475 -0.635) (size 1.95 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 40 "+3.3VA") (zone_connect 2))
    (pad "3" smd roundrect locked (at -2.475 0.635) (size 1.95 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 37 "Net-(C53-Pad2)") (zone_connect 2))
    (pad "4" smd roundrect locked (at -2.475 1.905) (size 1.95 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "5" smd roundrect locked (at 2.475 1.905) (size 1.95 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 39 "Net-(C55-Pad2)") (zone_connect 2))
    (pad "6" smd roundrect locked (at 2.475 0.635) (size 1.95 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 39 "Net-(C55-Pad2)") (zone_connect 2))
    (pad "7" smd roundrect locked (at 2.475 -0.635) (size 1.95 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 34 "+5V") (zone_connect 2))
    (pad "8" smd roundrect locked (at 2.475 -1.905) (size 1.95 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 34 "+5V") (zone_connect 2))
    (pad "9" smd rect locked (at 0 0) (size 1.8 2.5) (layers "B.Cu")
      (net 1 "GNDREF") (zone_connect 2))
    (pad "9" smd rect locked (at 0 0) (size 2.29 3) (layers "F.Cu" "F.Mask")
      (net 1 "GNDREF") (zone_connect 2))
    (pad "9" thru_hole circle locked (at -0.65 1) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "9" thru_hole circle locked (at 0.65 0) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "9" thru_hole circle locked (at -0.65 0) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "9" thru_hole circle locked (at 0.65 1) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "9" thru_hole circle locked (at 0.65 -1) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "9" thru_hole circle locked (at -0.65 -1) (size 0.5 0.5) (drill 0.2) (layers *.Cu)
      (net 1 "GNDREF") (zone_connect 2))
    (model "${KISYS3DMOD}/Package_SO.3dshapes/SOIC-8-1EP_3.9x4.9mm_P1.27mm_EP2.29x3mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Jumper:SolderJumper-2_P1.3mm_Open_RoundedPad1.0x1.5mm" (layer "F.Cu")
    (tedit 5B391E66)
    (at 96.7 101.5)
    (descr "SMD Solder Jumper, 1x1.5mm, rounded Pads, 0.3mm gap, open")
    (tags "solder jumper open")
    (attr exclude_from_pos_files exclude_from_bom)
    (fp_text reference "JP52" (at 0.2 2.6) (layer "F.SilkS"))
    (fp_text value "S" (at 0 1.9) (layer "F.Fab"))
    (pad "1" smd custom locked (at -0.65 0) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 40 "+3.3VA") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy 0.5 -0.75)
            (xy 0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
    (pad "2" smd custom locked (at 0.65 0) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 51 "Net-(C74-Pad2)") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy -0.5 -0.75)
            (xy -0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
  )
  (footprint "Inductor_SMD:L_0805_2012Metric_Pad1.05x1.20mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEF0)
    (at 96.9 99.1)
    (descr "Inductor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 80, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "inductor handsolder")
    (attr smd)
    (fp_text reference "L51" (at 0 -1.55) (layer "F.SilkS"))
    (fp_text value "100u" (at 0 1.55) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.15 0) (size 1.05 1.2) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2380942857)
      (net 116 "Net-(C56-Pad2)"))
    (pad "2" smd roundrect locked (at 1.15 0) (size 1.05 1.2) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.2380942857)
      (net 51 "Net-(C74-Pad2)"))
    (model "${KISYS3DMOD}/Inductor_SMD.3dshapes/L_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 117.094 136.144 180)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "D33" (at 3.71344 -0.43358) (layer "F.SilkS"))
    (fp_text value "res" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 2 "BiasT"))
    (pad "2" smd roundrect locked (at 1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 32 "Net-(C31-Pad1)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Jumper:SolderJumper-2_P1.3mm_Open_RoundedPad1.0x1.5mm" (layer "F.Cu")
    (tedit 5B391E66)
    (at 66.04 71.247)
    (descr "SMD Solder Jumper, 1x1.5mm, rounded Pads, 0.3mm gap, open")
    (tags "solder jumper open")
    (attr exclude_from_pos_files exclude_from_bom)
    (fp_text reference "JP53" (at 0 -1.8) (layer "F.SilkS"))
    (fp_text value "S" (at 0 1.9) (layer "F.Fab"))
    (pad "1" smd custom locked (at -0.65 0) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 91 "Net-(J52-Pad5)") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy 0.5 -0.75)
            (xy 0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
    (pad "2" smd custom locked (at 0.65 0) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 119 "Net-(JP53-Pad2)") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy -0.5 -0.75)
            (xy -0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
  )
  (footprint "Jumper:SolderJumper-2_P1.3mm_Open_RoundedPad1.0x1.5mm" (layer "F.Cu")
    (tedit 5B391E66)
    (at 60.579 92.583)
    (descr "SMD Solder Jumper, 1x1.5mm, rounded Pads, 0.3mm gap, open")
    (tags "solder jumper open")
    (attr exclude_from_pos_files exclude_from_bom)
    (fp_text reference "JP54" (at 0 -1.8) (layer "F.SilkS"))
    (fp_text value "S" (at 0 1.9) (layer "F.Fab"))
    (pad "1" smd custom locked (at -0.65 0) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 120 "Net-(JP54-Pad1)") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy 0.5 -0.75)
            (xy 0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
    (pad "2" smd custom locked (at 0.65 0) (size 1 0.5) (layers "F.Cu" "F.Mask")
      (net 92 "Net-(J52-Pad4)") (zone_connect 2)
      (options (clearance outline) (anchor rect))
      (primitives
        (gr_circle (center 0 0.25) (end 0.5 0.25) (width 0) (fill yes))
        (gr_circle (center 0 -0.25) (end 0.5 -0.25) (width 0) (fill yes))
        (gr_poly (pts
            (xy 0 -0.75)
            (xy -0.5 -0.75)
            (xy -0.5 0.75)
            (xy 0 0.75)
          ) (width 0) (fill yes))
      ))
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 109.347 92.964 90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R19" (at -3.55092 0.37084 90) (layer "F.SilkS"))
    (fp_text value "68R" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 90) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 7 "Net-(C5-Pad2)"))
    (pad "2" smd roundrect locked (at 1 0 90) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 9 "Net-(C6-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "my_library:IDC-Header_2x03_P2.54mm_SMD" (layer "F.Cu")
    (tedit 61E84F0B)
    (at 68.3 76.3 -90)
    (descr "Through hole IDC box header, 2x03, 2.54mm pitch, DIN 41651 / IEC 60603-13, double rows, https://docs.google.com/spreadsheets/d/16SsEcesNF15N3Lb4niX7dcUr-NY5_MFPQhobNuNppn4/edit#gid=0")
    (tags "Through hole vertical IDC box header THT 2x03 2.54mm double row")
    (attr through_hole)
    (fp_text reference "J52" (at 1.27 -6.1 90) (layer "F.SilkS"))
    (fp_text value "ICSP" (at 1.27 11.18 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 1.27 2.54) (layer "F.Fab"))
    (pad "1" smd rect locked (at 0 0 270) (size 1.7 1.7) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 89 "Net-(J52-Pad1)"))
    (pad "2" smd roundrect locked (at 2.54 0 270) (size 1.7 1.7) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 40 "+3.3VA"))
    (pad "3" smd roundrect locked (at 0 2.54 270) (size 1.7 1.7) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 90 "Net-(J52-Pad3)"))
    (pad "4" smd roundrect locked (at 2.54 2.54 270) (size 1.7 1.7) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 92 "Net-(J52-Pad4)"))
    (pad "5" smd roundrect locked (at 0 5.08 270) (size 1.7 1.7) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 91 "Net-(J52-Pad5)"))
    (pad "6" smd roundrect locked (at 2.54 5.08 270) (size 1.7 1.7) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (model "${KISYS3DMOD}/Connector_IDC.3dshapes/IDC-Header_2x03_P2.54mm_Vertical.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 43.8 103.6 90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R60" (at 0 -1.65 90) (layer "F.SilkS"))
    (fp_text value "2K2" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 90) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 60 "Net-(C92-Pad2)"))
    (pad "2" smd roundrect locked (at 1 0 90) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 52 "Net-(C83-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 61F1A2D2)
    (at 100.584 139.954)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C32" (at 0 -1.68) (layer "F.SilkS"))
    (fp_text value "100p" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 33 "Net-(C32-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.213)
      (net 1 "GNDREF") (zone_connect 2))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 61F1A2BB)
    (at 118.618 140.081)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C33" (at 0 -1.68) (layer "F.SilkS"))
    (fp_text value "100p" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 121 "Net-(C33-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.213)
      (net 1 "GNDREF") (zone_connect 2))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 38.735 122.936 180)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C34" (at -0.07112 2.20472) (layer "F.SilkS"))
    (fp_text value "10u" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 33 "Net-(C32-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 1 "GNDREF"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 30.607 107.95 180)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C35" (at -0.0381 1.89484) (layer "F.SilkS"))
    (fp_text value "10u" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 33 "Net-(C32-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 1 "GNDREF"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 88.9 131.445 90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C36" (at -0.05842 1.98374 90) (layer "F.SilkS"))
    (fp_text value "10u" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 33 "Net-(C32-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 1 "GNDREF"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 100.076 131.2965 90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C37" (at -3.39716 0.08382 90) (layer "F.SilkS"))
    (fp_text value "10u" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 33 "Net-(C32-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 1 "GNDREF"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 24.003 112.649 -90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C38" (at -3.66522 -0.11938 90) (layer "F.SilkS"))
    (fp_text value "10u" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 123 "Net-(C38-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 122 "Net-(C38-Pad2)"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 74.93 123.063 180)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C39" (at -0.00254 1.79832) (layer "F.SilkS"))
    (fp_text value "10u" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 33 "Net-(C32-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0 180) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 1 "GNDREF"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 29.083 116.586 90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C40" (at 0.00762 1.71196 90) (layer "F.SilkS"))
    (fp_text value "10u" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 35 "Net-(C40-Pad1)"))
    (pad "2" smd roundrect locked (at 1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 1 "GNDREF"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 34.925 122.936)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C41" (at 0 -1.68) (layer "F.SilkS"))
    (fp_text value "10u" (at 0 1.68) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 98 "+6V"))
    (pad "2" smd roundrect locked (at 1.0375 0) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 1 "GNDREF"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 88.9 127.635 -90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C43" (at -0.00508 -1.7272 90) (layer "F.SilkS"))
    (fp_text value "10u" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 97 "+5VP"))
    (pad "2" smd roundrect locked (at 1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 1 "GNDREF"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 102.108 125.73 -90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C44" (at -2.49428 -1.77038 90) (layer "F.SilkS"))
    (fp_text value "10u" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 95 "+5C"))
    (pad "2" smd roundrect locked (at 1.0375 0 270) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 1 "GNDREF"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Capacitor_SMD:C_0805_2012Metric_Pad1.18x1.45mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEF)
    (at 23.241 116.586 90)
    (descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
    (tags "capacitor handsolder")
    (attr smd)
    (fp_text reference "C45" (at 0 -1.68 90) (layer "F.SilkS"))
    (fp_text value "10u" (at 0 1.68 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 36 "-5V"))
    (pad "2" smd roundrect locked (at 1.0375 0 90) (size 1.175 1.45) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.212766)
      (net 1 "GNDREF"))
    (model "${KISYS3DMOD}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 42.434 120.777 180)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "D36" (at 0.1303 1.90246) (layer "F.SilkS"))
    (fp_text value "5V1" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 66 "Net-(D36-Pad1)"))
    (pad "2" smd roundrect locked (at 1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 65 "-5Vsense"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_TO_SOT_SMD:SOT-23" (layer "F.Cu")
    (tedit 5A02FF57)
    (at 102.87 129.413)
    (descr "SOT-23, Standard")
    (tags "SOT-23")
    (attr smd)
    (fp_text reference "Q33" (at 0.1524 2.86004) (layer "F.SilkS"))
    (fp_text value "BC849" (at 0 2.5) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd rect locked (at -1 -0.95) (size 0.9 0.8) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 126 "Net-(Q33-Pad1)"))
    (pad "2" smd rect locked (at -1 0.95) (size 0.9 0.8) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 1 "GNDREF"))
    (pad "3" smd rect locked (at 1 0) (size 0.9 0.8) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 100 "Net-(Q33-Pad3)"))
    (model "${KISYS3DMOD}/Package_TO_SOT_SMD.3dshapes/SOT-23.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 114.681 140.081)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R34" (at 0 -1.65) (layer "F.SilkS"))
    (fp_text value "100R" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 118 "Net-(J32-Pad1)"))
    (pad "2" smd roundrect locked (at 1 0) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 121 "Net-(C33-Pad1)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 107.823 140.081)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R37" (at -0.05334 2.17678) (layer "F.SilkS"))
    (fp_text value "4K7" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 33 "Net-(C32-Pad1)"))
    (pad "2" smd roundrect locked (at 1 0) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 121 "Net-(C33-Pad1)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 43.65498 123.6853 90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R38" (at 0.47752 1.99136 90) (layer "F.SilkS"))
    (fp_text value "47K" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 90) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 33 "Net-(C32-Pad1)"))
    (pad "2" smd roundrect locked (at 1 0 90) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 66 "Net-(D36-Pad1)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 100.076 127.381 -90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R39" (at -1.17602 -3.86842 90) (layer "F.SilkS"))
    (fp_text value "22K" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 95 "+5C"))
    (pad "2" smd roundrect locked (at 1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 126 "Net-(Q33-Pad1)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 43.65498 127.4793 -90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R40" (at 3.62534 -0.22606 90) (layer "F.SilkS"))
    (fp_text value "47K" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 33 "Net-(C32-Pad1)"))
    (pad "2" smd roundrect locked (at 1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 125 "Net-(Q32-Pad4)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 85.217 132.207 180)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R41" (at 0 -1.65) (layer "F.SilkS"))
    (fp_text value "47K" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 33 "Net-(C32-Pad1)"))
    (pad "2" smd roundrect locked (at 1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 100 "Net-(Q33-Pad3)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 96.52 132.207 180)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R42" (at 0 -1.65) (layer "F.SilkS"))
    (fp_text value "47K" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 33 "Net-(C32-Pad1)"))
    (pad "2" smd roundrect locked (at 1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 99 "Net-(Q31-Pad4)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 30.988 123.063 180)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R43" (at 0.04064 2.08534) (layer "F.SilkS"))
    (fp_text value "750R" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 98 "+6V"))
    (pad "2" smd roundrect locked (at 1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 127 "Net-(R43-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 30.099 125.984 -90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R44" (at -0.36322 2.09296 90) (layer "F.SilkS"))
    (fp_text value "200R" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 127 "Net-(R43-Pad2)"))
    (pad "2" smd roundrect locked (at 1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 1 "GNDREF"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 67.183 123.063 180)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R45" (at 0.02032 1.92532) (layer "F.SilkS"))
    (fp_text value "620R" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 34 "+5V"))
    (pad "2" smd roundrect locked (at 1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 128 "Net-(R45-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 66.294 125.984 -90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R46" (at -0.0381 1.8034 90) (layer "F.SilkS"))
    (fp_text value "200R" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 128 "Net-(R45-Pad2)"))
    (pad "2" smd roundrect locked (at 1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 1 "GNDREF"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 88.93556 123.809 90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R47" (at -0.02362 1.83134 90) (layer "F.SilkS"))
    (fp_text value "0R" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 90) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 97 "+5VP"))
    (pad "2" smd roundrect locked (at 1 0 90) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 129 "Net-(R47-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 85.725 122.809 180)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R48" (at 0.00254 1.71704) (layer "F.SilkS"))
    (fp_text value "res" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 129 "Net-(R47-Pad2)"))
    (pad "2" smd roundrect locked (at 1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 1 "GNDREF"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 100.076 123.587 90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R49" (at 1.46634 1.90754 90) (layer "F.SilkS"))
    (fp_text value "0R" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 90) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 95 "+5C"))
    (pad "2" smd roundrect locked (at 1 0 90) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 130 "Net-(R49-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 97.028 122.809 180)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R50" (at -0.03048 1.74498) (layer "F.SilkS"))
    (fp_text value "res" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 130 "Net-(R49-Pad2)"))
    (pad "2" smd roundrect locked (at 1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 1 "GNDREF"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_SO:SOIC-8_3.9x4.9mm_P1.27mm" (layer "F.Cu")
    (tedit 5D9F72B1)
    (at 28.829 111.887)
    (descr "SOIC, 8 Pin (JEDEC MS-012AA, https://www.analog.com/media/en/package-pcb-resources/package/pkg_pdf/soic_narrow-r/r_8.pdf), generated with kicad-footprint-generator ipc_gullwing_generator.py")
    (tags "SOIC SO")
    (attr smd)
    (fp_text reference "U31" (at -1.7399 -3.48996) (layer "F.SilkS"))
    (fp_text value "ICL7662" (at 0 3.4) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -2.475 -1.905) (size 1.95 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 131 "Net-(U31-Pad1)"))
    (pad "2" smd roundrect locked (at -2.475 -0.635) (size 1.95 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 123 "Net-(C38-Pad1)"))
    (pad "3" smd roundrect locked (at -2.475 0.635) (size 1.95 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "4" smd roundrect locked (at -2.475 1.905) (size 1.95 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 122 "Net-(C38-Pad2)"))
    (pad "5" smd roundrect locked (at 2.475 1.905) (size 1.95 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 35 "Net-(C40-Pad1)"))
    (pad "6" smd roundrect locked (at 2.475 0.635) (size 1.95 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 132 "Net-(U31-Pad6)"))
    (pad "7" smd roundrect locked (at 2.475 -0.635) (size 1.95 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 133 "Net-(U31-Pad7)"))
    (pad "8" smd roundrect locked (at 2.475 -1.905) (size 1.95 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 33 "Net-(C32-Pad1)"))
    (model "${KISYS3DMOD}/Package_SO.3dshapes/SOIC-8_3.9x4.9mm_P1.27mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_SO:HTSOP-8-1EP_3.9x4.9mm_P1.27mm_EP2.4x3.2mm" (layer "F.Cu")
    (tedit 5DC5FE74)
    (at 85.09 127.5 -90)
    (descr "HTSOP, 8 Pin (https://media.digikey.com/pdf/Data%20Sheets/Rohm%20PDFs/BD9G341EFJ.pdf), generated with kicad-footprint-generator ipc_gullwing_generator.py")
    (tags "HTSOP SO")
    (attr smd)
    (fp_text reference "U34" (at -0.03518 3.50266 90) (layer "F.SilkS"))
    (fp_text value "BD50HC5MEFJ" (at 0 3.4 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "" smd roundrect locked (at -0.6 -0.8 270) (size 0.97 1.29) (layers "F.Paste") (roundrect_rratio 0.25))
    (pad "" smd roundrect locked (at 0.6 -0.8 270) (size 0.97 1.29) (layers "F.Paste") (roundrect_rratio 0.25))
    (pad "" smd roundrect locked (at 0.6 0.8 270) (size 0.97 1.29) (layers "F.Paste") (roundrect_rratio 0.25))
    (pad "" smd roundrect locked (at -0.6 0.8 270) (size 0.97 1.29) (layers "F.Paste") (roundrect_rratio 0.25))
    (pad "1" smd roundrect locked (at -2.65 -1.905 270) (size 1.6 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 97 "+5VP"))
    (pad "2" smd roundrect locked (at -2.65 -0.635 270) (size 1.6 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 129 "Net-(R47-Pad2)"))
    (pad "3" smd roundrect locked (at -2.65 0.635 270) (size 1.6 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "4" smd roundrect locked (at -2.65 1.905 270) (size 1.6 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "5" smd roundrect locked (at 2.65 1.905 270) (size 1.6 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 100 "Net-(Q33-Pad3)"))
    (pad "6" smd roundrect locked (at 2.65 0.635 270) (size 1.6 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "7" smd roundrect locked (at 2.65 -0.635 270) (size 1.6 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "8" smd roundrect locked (at 2.65 -1.905 270) (size 1.6 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 33 "Net-(C32-Pad1)"))
    (pad "9" smd rect locked (at 0 0 270) (size 2.4 3.2) (layers "F.Cu" "F.Mask")
      (net 1 "GNDREF"))
    (model "${KISYS3DMOD}/Package_SO.3dshapes/HTSOP-8-1EP_3.9x4.9mm_P1.27mm_EP2.4x3.2mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_SO:HTSOP-8-1EP_3.9x4.9mm_P1.27mm_EP2.4x3.2mm" (layer "F.Cu")
    (tedit 5DC5FE74)
    (at 96.3 127.5 -90)
    (descr "HTSOP, 8 Pin (https://media.digikey.com/pdf/Data%20Sheets/Rohm%20PDFs/BD9G341EFJ.pdf), generated with kicad-footprint-generator ipc_gullwing_generator.py")
    (tags "HTSOP SO")
    (attr smd)
    (fp_text reference "U35" (at 0.00038 3.54682 90) (layer "F.SilkS"))
    (fp_text value "BD50HC5MEFJ" (at 0 3.4 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "" smd roundrect locked (at -0.6 0.8 270) (size 0.97 1.29) (layers "F.Paste") (roundrect_rratio 0.25))
    (pad "" smd roundrect locked (at -0.6 -0.8 270) (size 0.97 1.29) (layers "F.Paste") (roundrect_rratio 0.25))
    (pad "" smd roundrect locked (at 0.6 0.8 270) (size 0.97 1.29) (layers "F.Paste") (roundrect_rratio 0.25))
    (pad "" smd roundrect locked (at 0.6 -0.8 270) (size 0.97 1.29) (layers "F.Paste") (roundrect_rratio 0.25))
    (pad "1" smd roundrect locked (at -2.65 -1.905 270) (size 1.6 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 95 "+5C"))
    (pad "2" smd roundrect locked (at -2.65 -0.635 270) (size 1.6 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 130 "Net-(R49-Pad2)"))
    (pad "3" smd roundrect locked (at -2.65 0.635 270) (size 1.6 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "4" smd roundrect locked (at -2.65 1.905 270) (size 1.6 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "5" smd roundrect locked (at 2.65 1.905 270) (size 1.6 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 99 "Net-(Q31-Pad4)"))
    (pad "6" smd roundrect locked (at 2.65 0.635 270) (size 1.6 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "7" smd roundrect locked (at 2.65 -0.635 270) (size 1.6 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 1 "GNDREF"))
    (pad "8" smd roundrect locked (at 2.65 -1.905 270) (size 1.6 0.6) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.25)
      (net 33 "Net-(C32-Pad1)"))
    (pad "9" smd rect locked (at 0 0 270) (size 2.4 3.2) (layers "F.Cu" "F.Mask")
      (net 1 "GNDREF"))
    (model "${KISYS3DMOD}/Package_SO.3dshapes/HTSOP-8-1EP_3.9x4.9mm_P1.27mm_EP2.4x3.2mm.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_TO_SOT_SMD:SOT-23" (layer "F.Cu")
    (tedit 5A02FF57)
    (at 26.162 116.586 90)
    (descr "SOT-23, Standard")
    (tags "SOT-23")
    (attr smd)
    (fp_text reference "U36" (at -3.10134 0 90) (layer "F.SilkS"))
    (fp_text value "TC5950" (at 0 2.5 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd rect locked (at -1 -0.95 90) (size 0.9 0.8) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 36 "-5V"))
    (pad "2" smd rect locked (at -1 0.95 90) (size 0.9 0.8) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 35 "Net-(C40-Pad1)"))
    (pad "3" smd rect locked (at 1 0 90) (size 0.9 0.8) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 1 "GNDREF"))
    (model "${KISYS3DMOD}/Package_TO_SOT_SMD.3dshapes/SOT-23.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_TO_SOT_SMD:TO-263-5_TabPin6" (layer "F.Cu")
    (tedit 61F1A29C)
    (at 37 132.5 -90)
    (descr "TO-263 / D2PAK / DDPAK SMD package, http://www.infineon.com/cms/en/product/packages/PG-TO263/PG-TO263-5-1/")
    (tags "D2PAK DDPAK TO-263 D2PAK-5 TO-263-5 SOT-426")
    (attr smd)
    (fp_text reference "U32" (at 4.45172 -6.75658 90) (layer "F.SilkS"))
    (fp_text value "MIC29302" (at 0 6.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "" smd rect locked (at 5.8 -2.775 270) (size 4.55 5.25) (layers "F.Paste"))
    (pad "" smd rect locked (at 5.8 2.775 270) (size 4.55 5.25) (layers "F.Paste"))
    (pad "" smd rect locked (at 0.95 2.775 270) (size 4.55 5.25) (layers "F.Paste"))
    (pad "" smd rect locked (at 0.95 -2.775 270) (size 4.55 5.25) (layers "F.Paste"))
    (pad "1" smd rect locked (at -5.775 -3.4 270) (size 4.6 1.1) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 125 "Net-(Q32-Pad4)"))
    (pad "2" smd rect locked (at -5.775 -1.7 270) (size 4.6 1.1) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 33 "Net-(C32-Pad1)"))
    (pad "3" smd rect locked (at -5.775 0 270) (size 4.6 1.1) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 1 "GNDREF"))
    (pad "4" smd rect locked (at -5.775 1.7 270) (size 4.6 1.1) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 98 "+6V"))
    (pad "5" smd rect locked (at -5.775 3.4 270) (size 4.6 1.1) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 127 "Net-(R43-Pad2)"))
    (pad "6" smd rect locked (at 3.375 0 270) (size 9.4 10.8) (layers "F.Cu" "F.Mask")
      (net 1 "GNDREF") (zone_connect 2))
    (model "${KISYS3DMOD}/Package_TO_SOT_SMD.3dshapes/TO-263-5_TabPin6.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_TO_SOT_SMD:TO-263-5_TabPin6" (layer "F.Cu")
    (tedit 61F1A2A9)
    (at 73 132.5 -90)
    (descr "TO-263 / D2PAK / DDPAK SMD package, http://www.infineon.com/cms/en/product/packages/PG-TO263/PG-TO263-5-1/")
    (tags "D2PAK DDPAK TO-263 D2PAK-5 TO-263-5 SOT-426")
    (attr smd)
    (fp_text reference "U33" (at 0 -6.65 90) (layer "F.SilkS"))
    (fp_text value "MIC29302" (at 0 6.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "" smd rect locked (at 0.95 -2.775 270) (size 4.55 5.25) (layers "F.Paste"))
    (pad "" smd rect locked (at 5.8 -2.775 270) (size 4.55 5.25) (layers "F.Paste"))
    (pad "" smd rect locked (at 5.8 2.775 270) (size 4.55 5.25) (layers "F.Paste"))
    (pad "" smd rect locked (at 0.95 2.775 270) (size 4.55 5.25) (layers "F.Paste"))
    (pad "1" smd rect locked (at -5.775 -3.4 270) (size 4.6 1.1) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 33 "Net-(C32-Pad1)"))
    (pad "2" smd rect locked (at -5.775 -1.7 270) (size 4.6 1.1) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 33 "Net-(C32-Pad1)"))
    (pad "3" smd rect locked (at -5.775 0 270) (size 4.6 1.1) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 1 "GNDREF"))
    (pad "4" smd rect locked (at -5.775 1.7 270) (size 4.6 1.1) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 34 "+5V"))
    (pad "5" smd rect locked (at -5.775 3.4 270) (size 4.6 1.1) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 128 "Net-(R45-Pad2)"))
    (pad "6" smd rect locked (at 3.375 0 270) (size 9.4 10.8) (layers "F.Cu" "F.Mask")
      (net 1 "GNDREF") (zone_connect 2))
    (model "${KISYS3DMOD}/Package_TO_SOT_SMD.3dshapes/TO-263-5_TabPin6.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "MountingHole:MountingHole_3.2mm_M3_DIN965_Pad" (layer "F.Cu")
    (tedit 61F189D9)
    (at 37 144)
    (descr "Mounting Hole 3.2mm, M3, DIN965")
    (tags "mounting hole 3.2mm m3 din965")
    (attr exclude_from_pos_files exclude_from_bom)
    (fp_text reference "REF**" (at 0 -3.8) (layer "F.SilkS"))
    (fp_text value "MountingHole_3.2mm_M3_DIN965_Pad" (at 0 3.8) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0.3 0) (layer "F.Fab"))
    (pad "1" thru_hole circle locked (at -0.084 -0.018) (size 5.6 5.6) (drill 3.2) (layers *.Cu *.Mask)
      (net 1 "GNDREF"))
  )
  (footprint "MountingHole:MountingHole_3.2mm_M3_DIN965_Pad" (layer "F.Cu")
    (tedit 61F189D9)
    (at 73 144)
    (descr "Mounting Hole 3.2mm, M3, DIN965")
    (tags "mounting hole 3.2mm m3 din965")
    (attr exclude_from_pos_files exclude_from_bom)
    (fp_text reference "REF**" (at 0 -3.8) (layer "F.SilkS"))
    (fp_text value "MountingHole_3.2mm_M3_DIN965_Pad" (at 0 3.8) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0.3 0) (layer "F.Fab"))
    (pad "1" thru_hole circle locked (at -0.084 -0.018) (size 5.6 5.6) (drill 3.2) (layers *.Cu *.Mask)
      (net 1 "GNDREF"))
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 127.49784 85.50402)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R20" (at 0 -1.65) (layer "F.SilkS"))
    (fp_text value "10R" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 134 "Net-(L6-Pad2)"))
    (pad "2" smd roundrect locked (at 1 0) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 20 "Net-(C14-Pad1)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 92.75 80.6)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R61" (at 0 -1.65) (layer "F.SilkS"))
    (fp_text value "2K2" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 61 "Net-(C93-Pad2)"))
    (pad "2" smd roundrect locked (at 1 0) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 54 "Net-(C84-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Package_TO_SOT_SMD:SOT-23" (layer "F.Cu")
    (tedit 5A02FF57)
    (at 122.94362 122.0343 90)
    (descr "SOT-23, Standard")
    (tags "SOT-23")
    (attr smd)
    (fp_text reference "D2" (at -1.3843 -2.45618 90) (layer "F.SilkS"))
    (fp_text value "opt" (at 0 2.5 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd rect locked (at -1 -0.95 90) (size 0.9 0.8) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 1 "GNDREF"))
    (pad "2" smd rect locked (at -1 0.95 90) (size 0.9 0.8) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 1 "GNDREF"))
    (pad "3" smd rect locked (at 1 0 90) (size 0.9 0.8) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 135 "Net-(D2-Pad3)"))
    (model "${KISYS3DMOD}/Package_TO_SOT_SMD.3dshapes/SOT-23.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_1206_3216Metric_Pad1.30x1.75mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 127.28194 117.41658 90)
    (descr "Resistor SMD 1206 (3216 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R21" (at -3.95986 -0.0508 90) (layer "F.SilkS"))
    (fp_text value "res" (at 0 1.82 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.55 0 90) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.192308)
      (net 135 "Net-(D2-Pad3)"))
    (pad "2" smd roundrect locked (at 1.55 0 90) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.192308)
      (net 3 "Net-(C2-Pad1)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_1206_3216Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_1206_3216Metric_Pad1.30x1.75mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 124.36856 117.47246 90)
    (descr "Resistor SMD 1206 (3216 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R22" (at -4.02082 1.3335 90) (layer "F.SilkS"))
    (fp_text value "res" (at 0 1.82 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.55 0 90) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.192308)
      (net 135 "Net-(D2-Pad3)"))
    (pad "2" smd roundrect locked (at 1.55 0 90) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.192308)
      (net 3 "Net-(C2-Pad1)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_1206_3216Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_1206_3216Metric_Pad1.30x1.75mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 121.56694 117.58168 90)
    (descr "Resistor SMD 1206 (3216 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R23" (at -4.11988 -2.50444 90) (layer "F.SilkS"))
    (fp_text value "res" (at 0 1.82 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.55 0 90) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.192308)
      (net 135 "Net-(D2-Pad3)"))
    (pad "2" smd roundrect locked (at 1.55 0 90) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.192308)
      (net 3 "Net-(C2-Pad1)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_1206_3216Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_1206_3216Metric_Pad1.30x1.75mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 118.76532 117.58168 90)
    (descr "Resistor SMD 1206 (3216 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R24" (at -4.09448 -1.3589 90) (layer "F.SilkS"))
    (fp_text value "res" (at 0 1.82 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.55 0 90) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.192308)
      (net 135 "Net-(D2-Pad3)"))
    (pad "2" smd roundrect locked (at 1.55 0 90) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.192308)
      (net 3 "Net-(C2-Pad1)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_1206_3216Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 115.2779 102.7778 -90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R26" (at 0 -1.65 90) (layer "F.SilkS"))
    (fp_text value "0R" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 28 "Net-(C21-Pad2)"))
    (pad "2" smd roundrect locked (at 1 0 270) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 136 "Net-(JP2-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 61F96E3B)
    (at 112.3315 101.6381 180)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R27" (at 0 -1.65) (layer "F.SilkS"))
    (fp_text value "51R" (at 0 1.65) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 28 "Net-(C21-Pad2)"))
    (pad "2" smd roundrect locked (at 1 0 180) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208)
      (net 1 "GNDREF") (zone_connect 2))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_1206_3216Metric_Pad1.30x1.75mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 114.7439 113.29416)
    (descr "Resistor SMD 1206 (3216 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R6" (at 0 -1.82) (layer "F.SilkS"))
    (fp_text value "res" (at 0 1.82) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.55 0) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.192308)
      (net 94 "Net-(JP2-Pad1)"))
    (pad "2" smd roundrect locked (at 1.55 0) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.192308)
      (net 3 "Net-(C2-Pad1)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_1206_3216Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_1206_3216Metric_Pad1.30x1.75mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 114.79022 115.94084)
    (descr "Resistor SMD 1206 (3216 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R25" (at -0.09906 2.17424) (layer "F.SilkS"))
    (fp_text value "220R" (at 0 1.82) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1.55 0) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.192308)
      (net 94 "Net-(JP2-Pad1)"))
    (pad "2" smd roundrect locked (at 1.55 0) (size 1.3 1.75) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.192308)
      (net 3 "Net-(C2-Pad1)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_1206_3216Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "MountingHole:MountingHole_3.2mm_M3_DIN965_Pad" (layer "F.Cu")
    (tedit 61F189D9)
    (at 55 124)
    (descr "Mounting Hole 3.2mm, M3, DIN965")
    (tags "mounting hole 3.2mm m3 din965")
    (attr exclude_from_pos_files exclude_from_bom)
    (fp_text reference "REF**" (at 0 -3.8) (layer "F.SilkS"))
    (fp_text value "MountingHole_3.2mm_M3_DIN965_Pad" (at 0 3.8) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0.3 0) (layer "F.Fab"))
    (pad "1" thru_hole circle locked (at -0.084 -0.018) (size 5.6 5.6) (drill 3.2) (layers *.Cu *.Mask)
      (net 1 "GNDREF"))
  )
  (footprint "my_library:KF301-2P" (layer "F.Cu")
    (tedit 5950A6D0)
    (at 129.54 145)
    (attr through_hole)
    (fp_text reference "J33" (at 0 -2.5) (layer "F.SilkS"))
    (fp_text value "Bias-T" (at 0 4) (layer "F.Fab") hide)
    (pad "1" thru_hole oval locked (at -2.5 0) (size 4 4.5) (drill 1.2) (layers *.Cu *.Mask)
      (net 2 "BiasT"))
    (pad "2" thru_hole oval locked (at 2.5 0) (size 4 4.5) (drill 1.2) (layers *.Cu *.Mask)
      (net 1 "GNDREF"))
  )
  (footprint "my_library:SOT-25_HandSoldering" (layer "F.Cu")
    (tedit 5A0AB76C)
    (at 108.1 136.4 -90)
    (descr "SOT25 package")
    (tags "SOT-25 hand-soldering")
    (attr smd)
    (fp_text reference "Q31" (at 0 -2.9 90) (layer "F.SilkS"))
    (fp_text value "FMG1AT148" (at 0 2.9 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd rect locked (at -1.35 -0.95 270) (size 1.56 0.65) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 32 "Net-(C31-Pad1)"))
    (pad "2" smd rect locked (at -1.35 0 270) (size 1.56 0.65) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 1 "GNDREF"))
    (pad "3" smd rect locked (at -1.35 0.95 270) (size 1.56 0.65) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 121 "Net-(C33-Pad1)"))
    (pad "4" smd rect locked (at 1.35 0.95 270) (size 1.56 0.65) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 99 "Net-(Q31-Pad4)"))
    (pad "5" smd rect locked (at 1.35 -0.95 270) (size 1.56 0.65) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 121 "Net-(C33-Pad1)"))
    (model "${KISYS3DMOD}/Package_TO_SOT_SMD.3dshapes/SOT-23-5.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "my_library:SOT-25_HandSoldering" (layer "F.Cu")
    (tedit 5A0AB76C)
    (at 46.5 127.2 -90)
    (descr "SOT25 package")
    (tags "SOT-25 hand-soldering")
    (attr smd)
    (fp_text reference "Q32" (at 0 -2.9 90) (layer "F.SilkS"))
    (fp_text value "FMG1AT148" (at 0 2.9 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0) (layer "F.Fab"))
    (pad "1" smd rect locked (at -1.35 -0.95 270) (size 1.56 0.65) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 97 "+5VP"))
    (pad "2" smd rect locked (at -1.35 0 270) (size 1.56 0.65) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 1 "GNDREF"))
    (pad "3" smd rect locked (at -1.35 0.95 270) (size 1.56 0.65) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 66 "Net-(D36-Pad1)"))
    (pad "4" smd rect locked (at 1.35 0.95 270) (size 1.56 0.65) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 125 "Net-(Q32-Pad4)"))
    (pad "5" smd rect locked (at 1.35 -0.95 270) (size 1.56 0.65) (layers "F.Cu" "F.Paste" "F.Mask")
      (net 125 "Net-(Q32-Pad4)"))
    (model "${KISYS3DMOD}/Package_TO_SOT_SMD.3dshapes/SOT-23-5.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "Resistor_SMD:R_0805_2012Metric_Pad1.20x1.40mm_HandSolder" (layer "F.Cu")
    (tedit 5F68FEEE)
    (at 91.9 64.9 90)
    (descr "Resistor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal with elongated pad for handsoldering. (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
    (tags "resistor handsolder")
    (attr smd)
    (fp_text reference "R28" (at 0 -1.65 90) (layer "F.SilkS"))
    (fp_text value "150R" (at 0 1.65 90) (layer "F.Fab"))
    (fp_text user "${REFERENCE}" (at 0 0 90) (layer "F.Fab"))
    (pad "1" smd roundrect locked (at -1 0 90) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 24 "Net-(C16-Pad2)"))
    (pad "2" smd roundrect locked (at 1 0 90) (size 1.2 1.4) (layers "F.Cu" "F.Paste" "F.Mask") (roundrect_rratio 0.208333)
      (net 22 "Net-(C15-Pad2)"))
    (model "${KISYS3DMOD}/Resistor_SMD.3dshapes/R_0805_2012Metric.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "my_library:PinHeader_24GHzl" (layer "B.Cu")
    (tedit 61A0968F)
    (at 24.37 88.8 180)
    (descr "Through hole straight pin header, 2x10, 1.27mm pitch, double rows")
    (tags "Through hole pin header THT 2x10 1.27mm double row")
    (zone_connect 2)
    (attr through_hole)
    (fp_text reference "J2" (at 0.635 1.695) (layer "B.SilkS"))
    (fp_text value "Conn_LO" (at 0.635 -13.125) (layer "B.Fab"))
    (fp_text user "${REFERENCE}" (at 0.635 -5.715 -90) (layer "B.Fab"))
    (pad "" thru_hole circle locked (at 0.635 -15.215 180) (size 3 3) (drill 3) (layers *.Cu *.Mask)
      (zone_connect 2))
    (pad "" thru_hole circle locked (at 0.635 3.785 180) (size 3 3) (drill 3) (layers *.Cu *.Mask)
      (zone_connect 2))
    (pad "1" thru_hole rect locked (at 0 0 180) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 69 "Net-(J2-Pad1)") (zone_connect 2))
    (pad "2" thru_hole oval locked (at 1.27 0 180) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 70 "Net-(J2-Pad2)") (zone_connect 2))
    (pad "3" thru_hole oval locked (at 0 -1.27 180) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 71 "Net-(J2-Pad3)") (zone_connect 2))
    (pad "4" thru_hole oval locked (at 1.27 -1.27 180) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 71 "Net-(J2-Pad3)") (zone_connect 2))
    (pad "5" thru_hole oval locked (at 0 -2.54 180) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 34 "+5V") (zone_connect 2))
    (pad "6" thru_hole oval locked (at 1.27 -2.54 180) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 34 "+5V") (zone_connect 2))
    (pad "7" thru_hole oval locked (at 0 -3.81 180) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 72 "Net-(J2-Pad7)") (zone_connect 2))
    (pad "8" thru_hole oval locked (at 1.27 -3.81 180) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 72 "Net-(J2-Pad7)") (zone_connect 2))
    (pad "9" thru_hole oval locked (at 0 -5.08 180) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 36 "-5V") (zone_connect 2))
    (pad "10" thru_hole oval locked (at 1.27 -5.08 180) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 65 "-5Vsense") (zone_connect 2))
    (pad "11" thru_hole oval locked (at 0 -6.35 180) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 73 "Net-(J2-Pad11)") (zone_connect 2))
    (pad "12" thru_hole oval locked (at 1.27 -6.35 180) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 73 "Net-(J2-Pad11)") (zone_connect 2))
    (pad "13" thru_hole oval locked (at 0 -7.62 180) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "14" thru_hole oval locked (at 1.27 -7.62 180) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "15" thru_hole oval locked (at 0 -8.89 180) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "16" thru_hole oval locked (at 1.27 -8.89 180) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "17" thru_hole oval locked (at 0 -10.16 180) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 74 "Net-(J2-Pad17)") (zone_connect 2))
    (pad "18" thru_hole oval locked (at 1.27 -10.16 180) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 74 "Net-(J2-Pad17)") (zone_connect 2))
    (pad "19" thru_hole oval locked (at 0 -11.43 180) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "20" thru_hole oval locked (at 1.27 -11.43 180) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF") (zone_connect 2))
    (model "${KISYS3DMOD}/Connector_PinHeader_1.27mm.3dshapes/PinHeader_2x10_P1.27mm_Vertical.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "my_library:PinHeader_24GHzl" (layer "B.Cu")
    (tedit 61A0C15E)
    (at 45.95 59.95 90)
    (descr "Through hole straight pin header, 2x10, 1.27mm pitch, double rows")
    (tags "Through hole pin header THT 2x10 1.27mm double row")
    (attr through_hole)
    (fp_text reference "J3" (at 0.635 1.695 270) (layer "B.SilkS"))
    (fp_text value "Conn_TXIF" (at 0.635 -13.125 270) (layer "B.Fab"))
    (fp_text user "${REFERENCE}" (at 0.635 -5.715) (layer "B.Fab"))
    (pad "" thru_hole circle locked (at 0.635 -15.215 90) (size 3 3) (drill 3) (layers *.Cu *.Mask))
    (pad "" thru_hole circle locked (at 0.635 3.8 90) (size 3 3) (drill 3) (layers *.Cu *.Mask))
    (pad "1" thru_hole rect locked (at 0 0 90) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "2" thru_hole oval locked (at 1.27 0 90) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "3" thru_hole oval locked (at 0 -1.27 90) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 78 "Net-(J3-Pad3)"))
    (pad "4" thru_hole oval locked (at 1.27 -1.27 90) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 78 "Net-(J3-Pad3)"))
    (pad "5" thru_hole oval locked (at 0 -2.54 90) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "6" thru_hole oval locked (at 1.27 -2.54 90) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "7" thru_hole oval locked (at 0 -3.81 90) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF"))
    (pad "8" thru_hole oval locked (at 1.27 -3.81 90) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF"))
    (pad "9" thru_hole oval locked (at 0 -5.08 90) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF"))
    (pad "10" thru_hole oval locked (at 1.27 -5.08 90) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF"))
    (pad "11" thru_hole oval locked (at 0 -6.35 90) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF"))
    (pad "12" thru_hole oval locked (at 1.27 -6.35 90) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF"))
    (pad "13" thru_hole oval locked (at 0 -7.62 90) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF"))
    (pad "14" thru_hole oval locked (at 1.27 -7.62 90) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF"))
    (pad "15" thru_hole oval locked (at 0 -8.89 90) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 36 "-5V"))
    (pad "16" thru_hole oval locked (at 1.27 -8.89 90) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 36 "-5V"))
    (pad "17" thru_hole oval locked (at 0 -10.16 90) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 77 "Net-(J3-Pad17)"))
    (pad "18" thru_hole oval locked (at 1.27 -10.16 90) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 77 "Net-(J3-Pad17)"))
    (pad "19" thru_hole oval locked (at 0 -11.43 90) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 76 "Net-(J3-Pad19)"))
    (pad "20" thru_hole oval locked (at 1.27 -11.43 90) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 75 "Net-(J3-Pad20)"))
    (model "${KISYS3DMOD}/Connector_PinHeader_1.27mm.3dshapes/PinHeader_2x10_P1.27mm_Vertical.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (footprint "my_library:PinHeader_24GHzl" (layer "B.Cu")
    (tedit 61A0C14B)
    (at 133.1 100.23)
    (descr "Through hole straight pin header, 2x10, 1.27mm pitch, double rows")
    (tags "Through hole pin header THT 2x10 1.27mm double row")
    (attr through_hole)
    (fp_text reference "J4" (at 0.635 1.695) (layer "B.SilkS"))
    (fp_text value "Conn_RXIF" (at 0.635 -13.125) (layer "B.Fab"))
    (fp_text user "${REFERENCE}" (at 0.635 -5.715 270) (layer "B.Fab"))
    (pad "" thru_hole circle locked (at 0.635 -15.215) (size 3 3) (drill 3) (layers *.Cu *.Mask))
    (pad "" thru_hole circle locked (at 0.635 3.785) (size 3 3) (drill 3) (layers *.Cu *.Mask))
    (pad "1" thru_hole rect locked (at 0 0) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 79 "Net-(J4-Pad1)") (zone_connect 2))
    (pad "2" thru_hole oval locked (at 1.27 0) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 80 "Net-(J4-Pad2)") (zone_connect 2))
    (pad "3" thru_hole oval locked (at 0 -1.27) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 81 "Net-(J4-Pad3)"))
    (pad "4" thru_hole oval locked (at 1.27 -1.27) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 81 "Net-(J4-Pad3)"))
    (pad "5" thru_hole oval locked (at 0 -2.54) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "6" thru_hole oval locked (at 1.27 -2.54) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "7" thru_hole oval locked (at 0 -3.81) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 82 "Net-(J4-Pad7)"))
    (pad "8" thru_hole oval locked (at 1.27 -3.81) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 83 "Net-(J4-Pad8)"))
    (pad "9" thru_hole oval locked (at 0 -5.08) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF"))
    (pad "10" thru_hole oval locked (at 1.27 -5.08) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF"))
    (pad "11" thru_hole oval locked (at 0 -6.35) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "12" thru_hole oval locked (at 1.27 -6.35) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "13" thru_hole oval locked (at 0 -7.62) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 27 "Net-(C20-Pad1)"))
    (pad "14" thru_hole oval locked (at 1.27 -7.62) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 27 "Net-(C20-Pad1)"))
    (pad "15" thru_hole oval locked (at 0 -8.89) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "16" thru_hole oval locked (at 1.27 -8.89) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 1 "GNDREF") (zone_connect 2))
    (pad "17" thru_hole oval locked (at 0 -10.16) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 84 "Net-(J4-Pad17)"))
    (pad "18" thru_hole oval locked (at 1.27 -10.16) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 85 "Net-(J4-Pad18)"))
    (pad "19" thru_hole oval locked (at 0 -11.43) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 86 "Net-(J4-Pad19)"))
    (pad "20" thru_hole oval locked (at 1.27 -11.43) (size 1 1) (drill 0.65) (layers *.Cu *.Mask)
      (net 87 "Net-(J4-Pad20)"))
    (model "${KISYS3DMOD}/Connector_PinHeader_1.27mm.3dshapes/PinHeader_2x10_P1.27mm_Vertical.wrl"
      (offset (xyz 0 0 0))
      (scale (xyz 1 1 1))
      (rotate (xyz 0 0 0))
    )
  )
  (gr_line (start 138 82) (end 138 150) (layer "Edge.Cuts") (width 0.05))
  (gr_line (start 19.5 82) (end 19.5 150) (layer "Edge.Cuts") (width 0.05))
  (gr_line (start 27 82) (end 27 55.5) (layer "Edge.Cuts") (width 0.05))
  (gr_line (start 19.5 82) (end 27 82) (layer "Edge.Cuts") (width 0.05))
  (gr_line (start 27 55.5) (end 130.5 55.5) (layer "Edge.Cuts") (width 0.05))
  (gr_line (start 130.5 55.5) (end 130.5 82) (layer "Edge.Cuts") (width 0.05))
  (gr_line (start 130.5 82) (end 138 82) (layer "Edge.Cuts") (width 0.05))
  (gr_line (start 138 150) (end 19.5 150) (layer "Edge.Cuts") (width 0.05))
  (gr_text "BiasT" (at 129.032 139.954) (layer "F.SilkS"))
  (gr_text "PTT" (at 109.22 145.288) (layer "F.SilkS"))
  (gr_text "10MHz" (at 135.96112 143.12392 90) (layer "F.SilkS"))
  (gr_text "+6V" (at 53.79974 138.28522) (layer "F.SilkS"))
  (gr_text "+6.5V" (at 88.29294 145.44802) (layer "F.SilkS"))
  (gr_text "Wavelab 24GHz  V0.4\n PA0MHE" (at 74.00544 66.54292) (layer "F.SilkS"))
  (gr_text "TX" (at 63.8429 138.37412) (layer "F.SilkS"))
  (gr_text "IF" (at 135.64108 112.45088 90) (layer "F.SilkS"))
  (gr_text "-5V" (at 48.22698 138.18362) (layer "F.SilkS"))
  (gr_text "RX" (at 58.9407 138.25982) (layer "F.SilkS"))
  (zone (net 1) (net_name "GNDREF") (layer "F.Cu") (hatch edge 0.508)
    (connect_pads (clearance 0.508))
    (min_thickness 0.254)
    (fill yes (thermal_gap 0.508) (thermal_bridge_width 0.508))
    (polygon
      (pts
        (xy 130.5 82)
        (xy 138 82)
        (xy 138 150)
        (xy 19.5 150)
        (xy 19.5 82)
        (xy 27 82)
        (xy 27 55.5)
        (xy 130.5 55.5)
      )
    )
  )
  (zone (net 1) (net_name "GNDREF") (layer "B.Cu") (hatch edge 0.508)
    (connect_pads (clearance 0.508))
    (min_thickness 0.254)
    (fill yes (thermal_gap 0.508) (thermal_bridge_width 0.508))
    (polygon
      (pts
        (xy 130.50012 82.00136)
        (xy 138.00074 81.99882)
        (xy 138.00582 149.9997)
        (xy 19.49958 149.9997)
        (xy 19.49958 81.99882)
        (xy 27.0002 81.99882)
        (xy 27.0002 55.50154)
        (xy 130.50012 55.50154)
      )
    )
  )
  (zone (net 0) (net_name "") (layer "B.Mask") (hatch edge 0.508)
    (connect_pads (clearance 0.508))
    (min_thickness 0.254)
    (fill yes (thermal_gap 0.508) (thermal_bridge_width 0.508))
    (polygon
      (pts
        (xy 78.07706 140.93444)
        (xy 68.2371 140.93444)
        (xy 68.2371 131.09194)
        (xy 77.97292 131.09194)
      )
    )
  )
  (zone (net 0) (net_name "") (layer "B.Mask") (hatch edge 0.508)
    (connect_pads (clearance 0.508))
    (min_thickness 0.254)
    (fill yes (thermal_gap 0.508) (thermal_bridge_width 0.508))
    (polygon
      (pts
        (xy 41.9608 131.51104)
        (xy 41.9608 140.93444)
        (xy 32.22498 141.03858)
        (xy 32.0167 131.4069)
      )
    )
  )
)
